<p>[vc_row top="" bottom="32px"][vc_column width="1/3"][vc_single_image image="3154" img_size="full" alignment="center"][vc_empty_space][vc_column_text]</p>
<p style="text-align: center;"><strong> Dr. Lakshmi Devarajan - MD. DGO</strong></p>
<p style="text-align: center;"><strong>Gynaecologist</strong></p>
<p>[/vc_column_text][/vc_column][vc_column width="2/3"][vc_empty_space height="100px"][vc_column_text]</p>
<p align="justify">Dr. Lakshmi Devarajan is an MBBS, DGO, MD – Obstetrics and Gynaecology with over 44 years of experience in her fields. She is also a member of the Indian Medical Association (IMA) and has provided services in the fields mentioned above and men &amp; women screening, general health checkup, balance exercises etc.</p>
<p>[/vc_column_text][/vc_column][/vc_row][vc_row top="" bottom="32px"][vc_column width="1/3"][/vc_column][vc_column width="2/3"][/vc_column][/vc_row][vc_row][vc_column width="1/3"][/vc_column][vc_column width="2/3"][/vc_column][/vc_row]</p>
