<p>[vc_row][vc_column width="1/3"][vc_single_image image="3494" img_size="540x580" alignment="center" style="vc_box_outline" onclick="custom_link" link="/our-experts/"][vc_empty_space height="7px"][vc_column_text]<br />
<p style="line-height: 10px; text-align: center;"><strong>DR. LAKSHMI DEVARAJAN - MBBS, DGO</strong><br />
<span style="color: #e86221; font-size: 12px;"><br />
DIRECTOR - FERTILITY CENTER</span></p>
<p>[/vc_column_text][/vc_column][vc_column width="1/3"][vc_single_image image="3504" img_size="540x580" alignment="center" style="vc_box_outline" onclick="custom_link" link="/our-experts/"][vc_empty_space height="7px"][vc_column_text]</p>
<p style="line-height: 10px; text-align: center;"><strong>DR. V. RAJINI - MBBS, DGO</strong><br />
<span style="color: #e86221; font-size: 12px;"><br />
CHIEF CONSULTANT - FERTILITY CENTER</span></p>
<p>[/vc_column_text][/vc_column][vc_column width="1/3"][vc_single_image image="3537" img_size="540x580" alignment="center" style="vc_box_outline" onclick="custom_link" link="/our-experts/"][vc_empty_space height="7px"][vc_column_text]</p>
<p style="line-height: 10px; text-align: center;"><strong>DR. N. DIVYA - MD, FMAS</strong><br />
<span style="color: #e86221; font-size: 12px;"><br />
CONSULTANT - FERTILITY CENTER</span></p>
<p>[/vc_column_text][/vc_column][/vc_row]</p>
