-d7d07b38 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-d7d07b38.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-d7d07b38 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-d7d07b38 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-d7d07b38.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-231ef25e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-231ef25e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-231ef25e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-41c21e0d.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-41c21e0d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-41c21e0d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-41c21e0d .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-41c21e0d .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-41c21e0d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-41c21e0d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-41c21e0d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-41c21e0d .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-41c21e0d.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-41c21e0d.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-41c21e0d .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-41c21e0d.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-41c21e0d .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-41c21e0d .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-41c21e0d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8c4383c7{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8c4383c7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: center;flex-wrap: wrap;row-gap: 36px;}.wp-block-uagb-container.uagb-block-8c4383c7{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;row-gap: 36px;background-color: var(--ast-global-color-5);;}.uagb-block-94b45a96.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 1200px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d4a03254{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d4a03254 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 20px;}.wp-block-uagb-container.uagb-block-d4a03254{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;border-style: none;border-color: var(--ast-global-color-6);align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-24c55c54{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-24c55c54 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-24c55c54{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d1f1a173{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d1f1a173 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-d1f1a173{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-b19d1667.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b19d1667.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b19d1667.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-b19d1667 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b19d1667 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b19d1667.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-b19d1667 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-b19d1667 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-b19d1667 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-b19d1667 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-b19d1667.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-b19d1667 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-b19d1667 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-b19d1667.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1202b3b6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1202b3b6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-1202b3b6{padding-top: 64px;padding-bottom: 40px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-be48a6cb{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-be48a6cb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 12px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-be48a6cb{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 12px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ec0d038e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ec0d038e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ec0d038e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-bad1c591 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-bad1c591 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-bad1c591 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-675cd79a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-675cd79a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-675cd79a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-fa01e997 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-fa01e997 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-fa01e997 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-658970d0{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-658970d0 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-658970d0{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3fe715a8{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3fe715a8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3fe715a8{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-87cb3bae .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-87cb3bae.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-87cb3bae .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-87cb3bae .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-87cb3bae .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d1ae2bb9{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d1ae2bb9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d1ae2bb9{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-0bfc88eb .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0bfc88eb.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0bfc88eb .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0bfc88eb .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-0bfc88eb .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae35dcf6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae35dcf6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ae35dcf6{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-e5bc8594 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e5bc8594.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e5bc8594 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e5bc8594 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e5bc8594 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-af1c3188{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-af1c3188 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 36px;}.wp-block-uagb-container.uagb-block-af1c3188{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;row-gap: 36px;background: linear-gradient(0deg, var(--ast-global-color-5) 50%, var(--ast-global-color-4) 50%);;background-clip: padding-box;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9527e0d6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9527e0d6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-9527e0d6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;border-style: solid;border-color: var(--ast-global-color-6);background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-eab9a597{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-eab9a597 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 36px;}.wp-block-uagb-container.uagb-block-eab9a597{padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;row-gap: 36px;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-aa320a5c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-aa320a5c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-aa320a5c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-02f6b38a.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-02f6b38a.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 16px;height: 16px;line-height: 16px;font-size: 16px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 16px;font-size: 16px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-02f6b38a .uagb-ifb-icon{width: 16px;line-height: 16px;}.uagb-block-02f6b38a .uagb-ifb-icon > span{font-size: 16px;width: 16px;line-height: 16px;}.uagb-block-02f6b38a .uagb-iconbox-icon-wrap{width: 16px;height: 16px;line-height: 16px;}.uagb-block-02f6b38a .uagb-infobox-margin-wrapper{display: flex;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-aa90459a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-aa90459a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-aa90459a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-6be5ca1a.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-6be5ca1a.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 16px;height: 16px;line-height: 16px;font-size: 16px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 16px;font-size: 16px;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-6be5ca1a .uagb-ifb-icon{width: 16px;line-height: 16px;}.uagb-block-6be5ca1a .uagb-ifb-icon > span{font-size: 16px;width: 16px;line-height: 16px;}.uagb-block-6be5ca1a .uagb-iconbox-icon-wrap{width: 16px;height: 16px;line-height: 16px;}.uagb-block-6be5ca1a .uagb-infobox-margin-wrapper{display: flex;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-06831c8c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-06831c8c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-06831c8c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-4f63592c.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-4f63592c.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 16px;height: 16px;line-height: 16px;font-size: 16px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 16px;font-size: 16px;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-4f63592c .uagb-ifb-icon{width: 16px;line-height: 16px;}.uagb-block-4f63592c .uagb-ifb-icon > span{font-size: 16px;width: 16px;line-height: 16px;}.uagb-block-4f63592c .uagb-iconbox-icon-wrap{width: 16px;height: 16px;line-height: 16px;}.uagb-block-4f63592c .uagb-infobox-margin-wrapper{display: flex;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-22bab7c5{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-22bab7c5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-22bab7c5{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-b1ca413b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b1ca413b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 16px;height: 16px;line-height: 16px;font-size: 16px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 16px;font-size: 16px;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-b1ca413b .uagb-ifb-icon{width: 16px;line-height: 16px;}.uagb-block-b1ca413b .uagb-ifb-icon > span{font-size: 16px;width: 16px;line-height: 16px;}.uagb-block-b1ca413b .uagb-iconbox-icon-wrap{width: 16px;height: 16px;line-height: 16px;}.uagb-block-b1ca413b .uagb-infobox-margin-wrapper{display: flex;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 36px;}.wp-block-uagb-container.uagb-block-573dc06d{padding-top: 40px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 36px;background-color: var(--ast-global-color-5);;}.uagb-block-d8406bf7.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d8406bf7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d8406bf7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-d8406bf7 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d8406bf7 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d8406bf7.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-d8406bf7 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-d8406bf7 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-d8406bf7 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-d8406bf7 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-d8406bf7.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-d8406bf7 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-d8406bf7 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-d8406bf7.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;}.wp-block-uagb-container.uagb-block-13533f4b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae135cd8{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae135cd8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-ae135cd8{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-a6a9fd5f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.uagb-block-a6a9fd5f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-82b9f747 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3bd77aa2{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3bd77aa2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-3bd77aa2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-a0bdf96c.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.uagb-block-a0bdf96c.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e6dd03d4 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b30185e1{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b30185e1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-b30185e1{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-054607b6.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.uagb-block-054607b6.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a0382e85 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-03aa1b0b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-03aa1b0b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-03aa1b0b{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-03aa1b0b::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-bca57f74{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-bca57f74 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-bca57f74{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-e4e64def.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e4e64def .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e4e64def .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e4e64def .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e4e64def.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-e4e64def.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e4e64def.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7d0698a7{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7d0698a7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-7d0698a7{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-f29ad988.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f29ad988 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-f29ad988 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-f29ad988 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-f29ad988.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f29ad988.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-a2490583.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-2c1e865e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;border-color: #333;}.wp-block-uagb-buttons .uagb-block-2c1e865e .uagb-buttons-repeater.wp-block-button__link{border-style: none;border-color: #333;}}";s:7:"content";s:13164:"
<div class="wp-block-uagb-container uagb-block-a2a4bc6a alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-35a50032">
<div class="wp-block-uagb-info-box uagb-block-d7d07b38 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h1 class="uagb-ifb-title">Our Inspiring Journey</h1></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-231ef25e">
<div class="wp-block-uagb-info-box uagb-block-41c21e0d uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Discover our story and commitment to excellence in just a few lines.</p></div></div>
</div>
</div></div>



<div class="wp-block-uagb-container uagb-block-8c4383c7 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-image alignleft uagb-block-94b45a96 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg 780w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg" alt="" class="uag-image-80573" width="1200" height="350" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-d4a03254">
<div class="wp-block-uagb-container uagb-block-24c55c54">
<div class="wp-block-uagb-info-box uagb-block-7edef7ac uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">Our Story</h3></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-d1f1a173">
<div class="wp-block-uagb-info-box uagb-block-b19d1667 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">We started with a dream to redefine creativity and have since embarked on a journey marked by unwavering passion and innovation.</p></div></div>
</div>
</div>
</div></div>



<div class="wp-block-uagb-container uagb-block-1202b3b6 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-be48a6cb">
<div class="wp-block-uagb-container uagb-block-ec0d038e">
<div class="wp-block-uagb-info-box uagb-block-bad1c591 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Why Choose Us</h2></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-675cd79a">
<div class="wp-block-uagb-info-box uagb-block-fa01e997 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Discover the reasons that set us apart.</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-658970d0">
<div class="wp-block-uagb-container uagb-block-3fe715a8">
<div class="wp-block-uagb-info-box uagb-block-87cb3bae uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">01</h6><h5 class="uagb-ifb-title">Innovation</h5></div><p class="uagb-ifb-desc">We continuously push the boundaries of creativity to deliver innovative solutions.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-d1ae2bb9">
<div class="wp-block-uagb-info-box uagb-block-0bfc88eb uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">02</h6><h5 class="uagb-ifb-title">Expertise</h5></div><p class="uagb-ifb-desc">Our team of seasoned professionals brings unmatched expertise to every project.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-ae35dcf6">
<div class="wp-block-uagb-info-box uagb-block-e5bc8594 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">03</h6><h5 class="uagb-ifb-title">Collaboration</h5></div><p class="uagb-ifb-desc">We thrive on partnerships and teamwork, fostering collaborative efforts that result in groundbreaking solutions.</p></div></div>
</div>
</div>
</div></div>



<div class="wp-block-uagb-container uagb-block-af1c3188 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-9527e0d6">
<div class="wp-block-uagb-container uagb-block-eab9a597">
<div class="wp-block-uagb-container uagb-block-aa320a5c">
<div class="wp-block-uagb-info-box uagb-block-02f6b38a uagb-infobox__content-wrap  uagb-infobox-icon-left uagb-infobox-left uagb-infobox-image-valign-top"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">92%</h3></div><p class="uagb-ifb-desc">Stats title here</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-aa90459a">
<div class="wp-block-uagb-info-box uagb-block-6be5ca1a uagb-infobox__content-wrap  uagb-infobox-icon-left uagb-infobox-left uagb-infobox-image-valign-top"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">2,480</h3></div><p class="uagb-ifb-desc">Stats title here</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-06831c8c">
<div class="wp-block-uagb-info-box uagb-block-4f63592c uagb-infobox__content-wrap  uagb-infobox-icon-left uagb-infobox-left uagb-infobox-image-valign-top"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">12+</h3></div><p class="uagb-ifb-desc">Stats title here</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-22bab7c5">
<div class="wp-block-uagb-info-box uagb-block-b1ca413b uagb-infobox__content-wrap  uagb-infobox-icon-left uagb-infobox-left uagb-infobox-image-valign-top"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">640K</h3></div><p class="uagb-ifb-desc">Stats title here</p></div></div>
</div>
</div>
</div>
</div></div>



<div class="wp-block-uagb-container uagb-block-573dc06d alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-d8406bf7 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Our Team</h2></div><p class="uagb-ifb-desc">Meet the creative minds behind our success.</p></div></div>



<div class="wp-block-uagb-container uagb-block-13533f4b">
<div class="wp-block-uagb-container uagb-block-ae135cd8">
<div class="wp-block-uagb-image alignleft uagb-block-a6a9fd5f wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-01.jpg " sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-01.jpg" alt="" class="uag-image-77912" width="368" height="460" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-82b9f747 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Jane Cooper</h5></div><p class="uagb-ifb-desc">CEO</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-3bd77aa2">
<div class="wp-block-uagb-image uagb-block-a0bdf96c wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-none"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-24.jpg " sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-24.jpg" alt="" class="uag-image-78344" width="368" height="460" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-e6dd03d4 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Wade Warren</h5></div><p class="uagb-ifb-desc">Director</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-b30185e1">
<div class="wp-block-uagb-image uagb-block-054607b6 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-none"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-03.jpg " sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-03.jpg" alt="" class="uag-image-77914" width="368" height="460" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-a0382e85 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Esther Howard</h5></div><p class="uagb-ifb-desc">Manager</p></div></div>
</div>
</div>
</div></div>



<div class="wp-block-uagb-container uagb-block-03aa1b0b alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-bca57f74">
<div class="wp-block-uagb-info-box uagb-block-e4e64def uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Let's Create Together</h2></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-7d0698a7">
<div class="wp-block-uagb-info-box uagb-block-f29ad988 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Connect with us to explore how we can make your vision a reality. Join us in shaping the future.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-a2490583"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-2c1e865e wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>
</div></div>
";}s:8:"id-82424";a:10:{s:5:"title";s:12:"Home Page 05";s:3:"url";s:51:"https://websitedemos.net/astra-blocks/home-page-05/";s:3:"tag";a:0:{}s:8:"category";i:3391;s:16:"primary-category";s:0:"";s:4:"type";s:4:"page";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:284501:".wp-block-uagb-container.uagb-is-root-container .uagb-block-a8cad5bf{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-a8cad5bf .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a8cad5bf .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a8cad5bf .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a8cad5bf .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a8cad5bf .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a8cad5bf > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 72px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a8cad5bf{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 0px;padding-left: 40px;padding-right: 40px;margin-top:  !important;margin-bottom:  !important;row-gap: 72px;column-gap: 0px;overflow: visible;border-color: inherit;background: linear-gradient(0deg, var(--ast-global-color-4) 27%, var(--ast-global-color-5) 27%);;background-clip: padding-box;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-4546b65d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-4546b65d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-4546b65d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-4546b65d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-4546b65d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-4546b65d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-4546b65d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 32px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-4546b65d{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 32px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-2f5d6724 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2f5d6724 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-2f5d6724 .uagb-ifb-icon svg{fill: #333;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2f5d6724 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2f5d6724 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2f5d6724 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2f5d6724 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2f5d6724 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2f5d6724 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2f5d6724 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-2f5d6724.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2f5d6724.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0%;margin-top: 0%;margin-left: 30%;margin-right: 30%;}.uagb-block-2f5d6724 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-2f5d6724 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-2f5d6724 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-2f5d6724 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2f5d6724 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-2f5d6724.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-2f5d6724 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2f5d6724 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-2f5d6724 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-8a5fb7d2.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 0px;}.uagb-block-8a5fb7d2.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-a21e2965.wp-block-uagb-buttons-child .uagb-buttons-repeater{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-a21e2965 .wp-block-button__link{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-a21e2965 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a21e2965 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-button__wrapper .uagb-buttons-repeater{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a21e2965 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a21e2965 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-buttons-repeater.wp-block-button__link{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #333;border-style: none;}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: #333;}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: #333;}.wp-block-uagb-buttons .uagb-block-a21e2965.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #333;border-style: none;}.wp-block-uagb-buttons .uagb-block-a21e2965.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: #333;}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-buttons-repeater .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b10e0ea7{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-b10e0ea7 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b10e0ea7 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b10e0ea7 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b10e0ea7 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b10e0ea7 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b10e0ea7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-b10e0ea7{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 24px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0ee5377c{max-width: 25%;width: 100%;}.wp-block-uagb-container.uagb-block-0ee5377c .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0ee5377c .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0ee5377c .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0ee5377c .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0ee5377c .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0ee5377c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 20px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-0ee5377c{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 20px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-32cd06ad.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-32cd06ad .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-32cd06ad.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-32cd06ad.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;align-self: center;}.uagb-block-32cd06ad.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-32cd06ad.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-32cd06ad.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-32cd06ad.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-32cd06ad.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-32cd06ad.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-32cd06ad.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-32cd06ad.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-32cd06ad.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 282px;height: 370px;}.uagb-block-32cd06ad.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-32cd06ad.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-32cd06ad.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-32cd06ad.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0b30df08{max-width: 25%;width: 100%;}.wp-block-uagb-container.uagb-block-0b30df08 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0b30df08 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0b30df08 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0b30df08 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0b30df08 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0b30df08 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 20px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-0b30df08{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 20px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-56940d4a.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-56940d4a .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-56940d4a.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-56940d4a.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;align-self: center;}.uagb-block-56940d4a.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-56940d4a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-56940d4a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-56940d4a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-56940d4a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-56940d4a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-56940d4a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-56940d4a.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-56940d4a.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 282px;height: 420px;}.uagb-block-56940d4a.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-56940d4a.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-56940d4a.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-56940d4a.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b5836733{max-width: 25%;width: 100%;}.wp-block-uagb-container.uagb-block-b5836733 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b5836733 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b5836733 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b5836733 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b5836733 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b5836733 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 20px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-b5836733{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 20px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-efbb5c4b.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-efbb5c4b .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-efbb5c4b.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-efbb5c4b.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;align-self: center;}.uagb-block-efbb5c4b.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-efbb5c4b.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-efbb5c4b.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-efbb5c4b.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-efbb5c4b.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-efbb5c4b.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-efbb5c4b.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-efbb5c4b.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-efbb5c4b.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 282px;height: 370px;}.uagb-block-efbb5c4b.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-efbb5c4b.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-efbb5c4b.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-efbb5c4b.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1c3ff303{max-width: 25%;width: 100%;}.wp-block-uagb-container.uagb-block-1c3ff303 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-1c3ff303 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-1c3ff303 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-1c3ff303 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-1c3ff303 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1c3ff303 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 20px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-1c3ff303{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 20px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-b25d3ae6.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-b25d3ae6 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-b25d3ae6.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b25d3ae6.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;align-self: center;}.uagb-block-b25d3ae6.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b25d3ae6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b25d3ae6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-b25d3ae6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-b25d3ae6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-b25d3ae6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-b25d3ae6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-b25d3ae6.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-b25d3ae6.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 282px;height: 420px;}.uagb-block-b25d3ae6.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-b25d3ae6.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-b25d3ae6.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-b25d3ae6.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d1486fa4{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-d1486fa4 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d1486fa4 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d1486fa4 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d1486fa4 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d1486fa4 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d1486fa4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d1486fa4{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b3bab506{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-b3bab506 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b3bab506 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b3bab506 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b3bab506 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b3bab506 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b3bab506 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 30px;}.wp-block-uagb-container.uagb-block-b3bab506{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 30px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-accd5b03{max-width: 70%;width: 100%;}.wp-block-uagb-container.uagb-block-accd5b03 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-accd5b03 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-accd5b03 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-accd5b03 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-accd5b03 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-accd5b03 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 20px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-accd5b03{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 20px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-08247f23 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-08247f23 .uagb-ifb-icon svg{fill: #333;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-08247f23 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-08247f23 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-08247f23 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-08247f23 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-08247f23 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-08247f23 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-08247f23 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-08247f23 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-08247f23 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-08247f23.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-29305d9e{max-width: 30%;width: 100%;}.wp-block-uagb-container.uagb-block-29305d9e .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-29305d9e .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-29305d9e .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-29305d9e .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-29305d9e .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-29305d9e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-end;flex-wrap: nowrap;row-gap: 20px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-29305d9e{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 20px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-end;flex-wrap: nowrap;}.uagb-block-75dbe261.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 0px;}.uagb-block-75dbe261.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: right;align-items: center;}.wp-block-uagb-buttons .uagb-block-f5010bad .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-f5010bad .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-f5010bad .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-button__wrapper .uagb-buttons-repeater{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-f5010bad .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-f5010bad .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-f5010bad.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-f5010bad.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-dba2a2c9{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-dba2a2c9 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-dba2a2c9 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-dba2a2c9 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-dba2a2c9 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-dba2a2c9 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-dba2a2c9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-dba2a2c9{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-658970d0{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-658970d0 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-658970d0 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-658970d0 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-658970d0 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-658970d0 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-658970d0 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-658970d0{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3fe715a8{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-3fe715a8 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3fe715a8 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3fe715a8 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3fe715a8 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3fe715a8 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3fe715a8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3fe715a8{box-shadow: 0px 0px   #00000070 ;padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-87cb3bae .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-87cb3bae .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-87cb3bae .uagb-ifb-icon svg{fill: #333;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-87cb3bae .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-87cb3bae .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-87cb3bae .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-87cb3bae .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-87cb3bae.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-87cb3bae.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-87cb3bae .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-87cb3bae .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-87cb3bae .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-87cb3bae .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-87cb3bae .uagb-infobox__content-wrap{text-align: left;}.uagb-block-87cb3bae.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-87cb3bae.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d1ae2bb9{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-d1ae2bb9 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d1ae2bb9 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d1ae2bb9 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d1ae2bb9 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d1ae2bb9 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d1ae2bb9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d1ae2bb9{box-shadow: 0px 0px   #00000070 ;padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-0bfc88eb .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0bfc88eb .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-0bfc88eb .uagb-ifb-icon svg{fill: #333;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0bfc88eb .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0bfc88eb .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0bfc88eb .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0bfc88eb .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0bfc88eb.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0bfc88eb.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0bfc88eb .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-0bfc88eb .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-0bfc88eb .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-0bfc88eb .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0bfc88eb .uagb-infobox__content-wrap{text-align: left;}.uagb-block-0bfc88eb.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae35dcf6{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-ae35dcf6 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ae35dcf6 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ae35dcf6 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ae35dcf6 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ae35dcf6 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae35dcf6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ae35dcf6{box-shadow: 0px 0px   #00000070 ;padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-e5bc8594 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e5bc8594 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-e5bc8594 .uagb-ifb-icon svg{fill: #333;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e5bc8594 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e5bc8594 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e5bc8594 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e5bc8594 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e5bc8594.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e5bc8594.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e5bc8594 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-e5bc8594 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-e5bc8594 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-e5bc8594 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e5bc8594 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-e5bc8594.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-e5bc8594.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-74f2c06c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-74f2c06c .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-74f2c06c .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-74f2c06c .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-74f2c06c .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-74f2c06c .uagb-container__video-wrap video{opacity: 0.3;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-74f2c06c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 768px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-74f2c06c{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;overflow: visible;border-color: inherit;background-repeat: no-repeat;background-position: 50% 50%;background-size: cover;background-attachment: scroll;background-image: url(https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg);;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-74f2c06c::before{content: "";position: absolute;pointer-events: none;top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);border-color: inherit;background: var(--ast-global-color-7);opacity: 0.7;}.uagb-block-daaa5215 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-daaa5215 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-daaa5215 .uagb-ifb-icon svg{fill: #333;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-daaa5215 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-daaa5215 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-daaa5215 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-daaa5215 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-daaa5215 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-daaa5215 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-daaa5215.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-daaa5215 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: #ffffff;margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-daaa5215.wp-block-uagb-info-box .uagb-ifb-title{color: #ffffff;margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-daaa5215.wp-block-uagb-info-box .uagb-ifb-desc{color: #ffffff;margin-bottom: 0%;margin-top: 0%;margin-left: 18%;margin-right: 18%;}.uagb-block-daaa5215 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-daaa5215 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-daaa5215 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-daaa5215 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-daaa5215 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-daaa5215.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-daaa5215.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-daaa5215.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-daaa5215 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-daaa5215 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-daaa5215 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-f8796360.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-f8796360.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-6cc092b8.wp-block-uagb-buttons-child .uagb-buttons-repeater{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-6cc092b8 .wp-block-button__link{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-6cc092b8 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-6cc092b8 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-button__wrapper .uagb-buttons-repeater{color: #ffffff;margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-buttons-repeater.wp-block-button__link{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #333;border-style: none;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: #333;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: #333;}.wp-block-uagb-buttons .uagb-block-6cc092b8.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #333;border-style: none;}.wp-block-uagb-buttons .uagb-block-6cc092b8.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: #333;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-buttons-repeater .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8c4383c7{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-8c4383c7 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8c4383c7 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8c4383c7 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8c4383c7 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8c4383c7 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8c4383c7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-8c4383c7{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c7857b8c{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c7857b8c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-c7857b8c{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;}.uagb-block-955803d2.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-955803d2 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-955803d2.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;align-self: center;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 450px;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-955803d2.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d4a03254{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d4a03254 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-d4a03254{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;flex-direction: row;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-7edef7ac .uagb-ifb-icon svg{fill: #333;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-7edef7ac .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-7edef7ac .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-7edef7ac .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link{color: var(--ast-global-color-2);}.uagb-block-7edef7ac div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link:hover{color: var(--ast-global-color-0);}.uagb-block-7edef7ac div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link:focus{color: var(--ast-global-color-0);}.uagb-block-7edef7ac .uagb-infobox-cta-link:hover svg{fill: var(--ast-global-color-0);}.uagb-block-7edef7ac .uagb-infobox-cta-link:focus svg{fill: var(--ast-global-color-0);}.uagb-block-7edef7ac .uagb-infobox-cta-link svg{fill: var(--ast-global-color-2);}.uagb-block-7edef7ac .uagb-infobox__content-wrap{text-align: left;}.uagb-block-7edef7ac.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-7edef7ac.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-7edef7ac .uagb-infobox-cta-link{font-weight: 600;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-af1c3188{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-af1c3188 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-af1c3188 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-af1c3188 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-af1c3188 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-af1c3188 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-af1c3188 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-af1c3188{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 48px;padding-left: 40px;padding-right: 40px;margin-top:  !important;margin-bottom:  !important;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;background: linear-gradient(0deg, var(--ast-global-color-5) 60%, var(--ast-global-color-4) 60%);;background-clip: padding-box;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9527e0d6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-9527e0d6 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9527e0d6 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9527e0d6 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9527e0d6 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9527e0d6 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9527e0d6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-9527e0d6{box-shadow: 0px 4px 8px -2px rgba(0,0,0,0.12) ;padding-top: 48px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 72px;overflow: visible;border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 12px;border-top-right-radius: 12px;border-bottom-left-radius: 12px;border-bottom-right-radius: 12px;border-style: solid;border-color: var(--ast-global-color-6);background-color: var(--ast-global-color-5);;flex-direction: column;align-items: flex-start;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-eab9a597{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-eab9a597 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-eab9a597 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-eab9a597 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-eab9a597 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-eab9a597 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-eab9a597 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-eab9a597{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 24px;overflow: visible;border-color: inherit;flex-direction: row;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-aa320a5c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-aa320a5c .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-aa320a5c .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-aa320a5c .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-aa320a5c .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-aa320a5c .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-aa320a5c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-aa320a5c{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-02f6b38a .uagb-ifb-icon{width: 24px;line-height: 24px;}.uagb-block-02f6b38a .uagb-ifb-icon > span{font-size: 24px;width: 24px;line-height: 24px;color: var(--ast-global-color-2);}.uagb-block-02f6b38a .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 24px;height: 24px;line-height: 24px;font-size: 24px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 24px;font-size: 24px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-02f6b38a .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 24px;height: 24px;line-height: 24px;padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 24px;line-height: 24px;font-size: 24px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 24px;line-height: 24px;font-size: 24px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-02f6b38a .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;}.uagb-block-02f6b38a .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap img{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;border-radius: 0px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;border-radius: 0px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;border-radius: 0px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;border-radius: 0px;}.uagb-block-02f6b38a .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-02f6b38a.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 12px;margin-left: 10px;}.uagb-block-02f6b38a.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 10px;margin-right: 0px;}.uagb-block-02f6b38a .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-02f6b38a .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-02f6b38a .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-02f6b38a .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-02f6b38a .uagb-iconbox-icon-wrap.uagb-infobox-shape-circle{background-color: var(--ast-global-color-4);border-radius: 50%;}.uagb-block-02f6b38a .uagb-iconbox-icon-wrap.uagb-infobox-shape-squre{background-color: var(--ast-global-color-4);}.uagb-block-02f6b38a .uagb-iconbox-icon-wrap:hover{background-color:  !important;}.uagb-block-02f6b38a.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-aa90459a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-aa90459a .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-aa90459a .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-aa90459a .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-aa90459a .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-aa90459a .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-aa90459a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-aa90459a{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-6be5ca1a .uagb-ifb-icon{width: 24px;line-height: 24px;}.uagb-block-6be5ca1a .uagb-ifb-icon > span{font-size: 24px;width: 24px;line-height: 24px;color: var(--ast-global-color-2);}.uagb-block-6be5ca1a .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 24px;height: 24px;line-height: 24px;font-size: 24px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 24px;font-size: 24px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-6be5ca1a .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 24px;height: 24px;line-height: 24px;padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 24px;line-height: 24px;font-size: 24px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 24px;line-height: 24px;font-size: 24px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-6be5ca1a .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;}.uagb-block-6be5ca1a .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap img{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;border-radius: 0px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;border-radius: 0px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;border-radius: 0px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;border-radius: 0px;}.uagb-block-6be5ca1a .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-6be5ca1a.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 12px;margin-left: 10px;}.uagb-block-6be5ca1a.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 10px;margin-right: 0px;}.uagb-block-6be5ca1a .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-6be5ca1a .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-6be5ca1a .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-6be5ca1a .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-6be5ca1a .uagb-iconbox-icon-wrap.uagb-infobox-shape-circle{background-color: var(--ast-global-color-4);border-radius: 50%;}.uagb-block-6be5ca1a .uagb-iconbox-icon-wrap.uagb-infobox-shape-squre{background-color: var(--ast-global-color-4);}.uagb-block-6be5ca1a .uagb-iconbox-icon-wrap:hover{background-color:  !important;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-06831c8c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-06831c8c .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-06831c8c .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-06831c8c .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-06831c8c .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-06831c8c .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-06831c8c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-06831c8c{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-4f63592c .uagb-ifb-icon{width: 24px;line-height: 24px;}.uagb-block-4f63592c .uagb-ifb-icon > span{font-size: 24px;width: 24px;line-height: 24px;color: var(--ast-global-color-2);}.uagb-block-4f63592c .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 24px;height: 24px;line-height: 24px;font-size: 24px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 24px;font-size: 24px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-4f63592c .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 24px;height: 24px;line-height: 24px;padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 24px;line-height: 24px;font-size: 24px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 24px;line-height: 24px;font-size: 24px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-4f63592c .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;}.uagb-block-4f63592c .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-4f63592c.uagb-infobox__content-wrap img{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;border-radius: 0px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;border-radius: 0px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;border-radius: 0px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;border-radius: 0px;}.uagb-block-4f63592c .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-4f63592c.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 12px;margin-top: 0px;margin-left: 10px;margin-right: 0px;}.uagb-block-4f63592c.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 10px;margin-right: 0px;}.uagb-block-4f63592c .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-4f63592c .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-4f63592c .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-4f63592c .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-4f63592c .uagb-iconbox-icon-wrap.uagb-infobox-shape-circle{background-color: var(--ast-global-color-4);border-radius: 50%;}.uagb-block-4f63592c .uagb-iconbox-icon-wrap.uagb-infobox-shape-squre{background-color: var(--ast-global-color-4);}.uagb-block-4f63592c .uagb-iconbox-icon-wrap:hover{background-color:  !important;}.uagb-block-4f63592c.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-4f63592c.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-22bab7c5{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-22bab7c5 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-22bab7c5 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-22bab7c5 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-22bab7c5 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-22bab7c5 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-22bab7c5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-22bab7c5{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-b1ca413b .uagb-ifb-icon{width: 24px;line-height: 24px;}.uagb-block-b1ca413b .uagb-ifb-icon > span{font-size: 24px;width: 24px;line-height: 24px;color: var(--ast-global-color-2);}.uagb-block-b1ca413b .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 24px;height: 24px;line-height: 24px;font-size: 24px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 24px;font-size: 24px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-b1ca413b .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 24px;height: 24px;line-height: 24px;padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 24px;line-height: 24px;font-size: 24px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 24px;line-height: 24px;font-size: 24px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-b1ca413b .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;}.uagb-block-b1ca413b .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap img{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;border-radius: 0px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;border-radius: 0px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;border-radius: 0px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 12px;padding-right: 12px;padding-top: 12px;padding-bottom: 12px;border-radius: 0px;}.uagb-block-b1ca413b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-b1ca413b.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 12px;margin-left: 10px;}.uagb-block-b1ca413b.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 10px;margin-right: 0px;}.uagb-block-b1ca413b .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-b1ca413b .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-b1ca413b .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-b1ca413b .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-b1ca413b .uagb-iconbox-icon-wrap.uagb-infobox-shape-circle{background-color: var(--ast-global-color-4);border-radius: 50%;}.uagb-block-b1ca413b .uagb-iconbox-icon-wrap.uagb-infobox-shape-squre{background-color: var(--ast-global-color-4);}.uagb-block-b1ca413b .uagb-iconbox-icon-wrap:hover{background-color:  !important;}.uagb-block-b1ca413b.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-eae8dfad{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-eae8dfad .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-eae8dfad .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-eae8dfad .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-eae8dfad .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-eae8dfad .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-eae8dfad > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 80px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-eae8dfad{box-shadow: 0px 0px   #00000070 ;padding-top: 62px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 80px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-5);;}.uagb-block-bc2ef517 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-bc2ef517 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-bc2ef517 .uagb-ifb-icon svg{fill: #333;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-bc2ef517 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-bc2ef517 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-bc2ef517 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-bc2ef517 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-bc2ef517 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-bc2ef517 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-bc2ef517 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-bc2ef517.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-bc2ef517.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-bc2ef517 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-bc2ef517 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-bc2ef517 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-bc2ef517 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-bc2ef517 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-bc2ef517.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-bc2ef517.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0%;padding-right: 15%;padding-bottom: 0%;padding-left: 15%;}.uagb-block-bc2ef517.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0%;padding-right: 15%;padding-bottom: 0%;padding-left: 15%;}.uagb-block-bc2ef517 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-bc2ef517 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-bc2ef517 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-fcbe98d1{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-fcbe98d1 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-fcbe98d1 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-fcbe98d1 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-fcbe98d1 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-fcbe98d1 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-fcbe98d1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-fcbe98d1{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-155e7429{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-155e7429 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-155e7429 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-155e7429 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-155e7429 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-155e7429 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-155e7429 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-155e7429{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;} .uagb-block-681138c6 .uag-star-rating{font-size: 20px;} .uagb-block-681138c6 .uag-star-rating > span{margin-right: 2px;color: #ccd6df;} .uagb-block-681138c6 .uag-star:nth-child(-n+5){color: #f0ad4e;} .uagb-block-681138c6 .uag-star-rating__title{margin-right: 10px;} .uagb-block-681138c6.wp-block-uagb-star-rating {flex-direction: row;justify-content: center;margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;} .uagb-block-681138c6 .uag-star:nth-child(5):before{color: #f0ad4e;width: 0%;position: absolute;content: '★';overflow: hidden;} .uagb-block-681138c6 .uag-star:nth-child(5){position: relative;}.uagb-block-3c9e036a .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3c9e036a .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-3c9e036a .uagb-ifb-icon svg{fill: #333;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3c9e036a .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3c9e036a .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3c9e036a .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3c9e036a .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3c9e036a .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3c9e036a .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3c9e036a .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-3c9e036a.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 10px;}.uagb-block-3c9e036a.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-2);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3c9e036a .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-3c9e036a .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-3c9e036a .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-3c9e036a .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3c9e036a .uagb-infobox__content-wrap{text-align: center;}.uagb-block-3c9e036a.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-3c9e036a.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-3c9e036a .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-3c9e036a .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-3c9e036a .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-4718dd31 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-4718dd31 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-4718dd31 .uagb-ifb-icon svg{fill: #333;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-4718dd31 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-4718dd31 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4718dd31 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-4718dd31 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-4718dd31 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4718dd31 .uagb-infobox .uagb-ifb-image-content img{border-radius: 100px;}.uagb-block-4718dd31.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 100px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 100px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 100px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 100px;}.uagb-block-4718dd31 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-4718dd31.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 0px;margin-top: 12px;margin-left: 0px;margin-right: 0px;}.uagb-block-4718dd31.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-4718dd31 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-4718dd31 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-4718dd31 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-4718dd31 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-4718dd31 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-4718dd31.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-4718dd31.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-4718dd31.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-4718dd31 .uagb-ifb-content .uagb-ifb-image-content > img{width: 60px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 60px;}.uagb-block-4718dd31 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 60px;}.uagb-block-4718dd31 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 60px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1a93771e{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-1a93771e .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-1a93771e .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-1a93771e .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-1a93771e .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-1a93771e .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1a93771e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-1a93771e{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;} .uagb-block-cdda6aae .uag-star-rating{font-size: 20px;} .uagb-block-cdda6aae .uag-star-rating > span{margin-right: 2px;color: #ccd6df;} .uagb-block-cdda6aae .uag-star:nth-child(-n+5){color: #f0ad4e;} .uagb-block-cdda6aae .uag-star-rating__title{margin-right: 10px;} .uagb-block-cdda6aae.wp-block-uagb-star-rating {flex-direction: row;justify-content: center;margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;} .uagb-block-cdda6aae .uag-star:nth-child(5):before{color: #f0ad4e;width: 0%;position: absolute;content: '★';overflow: hidden;} .uagb-block-cdda6aae .uag-star:nth-child(5){position: relative;}.uagb-block-ed5c6c14 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ed5c6c14 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-ed5c6c14 .uagb-ifb-icon svg{fill: #333;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ed5c6c14 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ed5c6c14 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ed5c6c14 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ed5c6c14 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ed5c6c14 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ed5c6c14 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ed5c6c14 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-ed5c6c14.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 10px;}.uagb-block-ed5c6c14.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-2);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ed5c6c14 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-ed5c6c14 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-ed5c6c14 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-ed5c6c14 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ed5c6c14 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-ed5c6c14.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ed5c6c14 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ed5c6c14 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-ed5c6c14 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-1c8709e0 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-1c8709e0 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-1c8709e0 .uagb-ifb-icon svg{fill: #333;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-1c8709e0 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-1c8709e0 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c8709e0 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-1c8709e0 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-1c8709e0 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c8709e0 .uagb-infobox .uagb-ifb-image-content img{border-radius: 100px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 100px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 100px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 100px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 100px;}.uagb-block-1c8709e0 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-1c8709e0.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 0px;margin-top: 12px;margin-left: 0px;margin-right: 0px;}.uagb-block-1c8709e0.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1c8709e0 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-1c8709e0 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-1c8709e0 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-1c8709e0 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-1c8709e0 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-1c8709e0.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-1c8709e0.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-1c8709e0 .uagb-ifb-content .uagb-ifb-image-content > img{width: 60px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 60px;}.uagb-block-1c8709e0 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 60px;}.uagb-block-1c8709e0 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 60px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-86558484{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-86558484 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-86558484 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-86558484 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-86558484 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-86558484 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-86558484 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-86558484{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;} .uagb-block-490af9a3 .uag-star-rating{font-size: 20px;} .uagb-block-490af9a3 .uag-star-rating > span{margin-right: 2px;color: #ccd6df;} .uagb-block-490af9a3 .uag-star:nth-child(-n+5){color: #f0ad4e;} .uagb-block-490af9a3 .uag-star-rating__title{margin-right: 10px;} .uagb-block-490af9a3.wp-block-uagb-star-rating {flex-direction: row;justify-content: center;margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;} .uagb-block-490af9a3 .uag-star:nth-child(5):before{color: #f0ad4e;width: 0%;position: absolute;content: '★';overflow: hidden;} .uagb-block-490af9a3 .uag-star:nth-child(5){position: relative;}.uagb-block-30116a41 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-30116a41 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-30116a41 .uagb-ifb-icon svg{fill: #333;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-30116a41 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-30116a41 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-30116a41 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-30116a41 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-30116a41 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-30116a41 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-30116a41.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-30116a41 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-30116a41.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 10px;}.uagb-block-30116a41.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-2);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-30116a41 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-30116a41 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-30116a41 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-30116a41 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-30116a41 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-30116a41.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-30116a41.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-30116a41.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-30116a41 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-30116a41 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-30116a41 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-fcda15cd .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-fcda15cd .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-fcda15cd .uagb-ifb-icon svg{fill: #333;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-fcda15cd .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-fcda15cd .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fcda15cd .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-fcda15cd .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-fcda15cd .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fcda15cd .uagb-infobox .uagb-ifb-image-content img{border-radius: 100px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 100px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 100px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 100px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 100px;}.uagb-block-fcda15cd .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-fcda15cd.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 0px;margin-top: 12px;margin-left: 0px;margin-right: 0px;}.uagb-block-fcda15cd.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-fcda15cd .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-fcda15cd .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-fcda15cd .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-fcda15cd .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-fcda15cd .uagb-infobox__content-wrap{text-align: center;}.uagb-block-fcda15cd.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-fcda15cd.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-fcda15cd .uagb-ifb-content .uagb-ifb-image-content > img{width: 60px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 60px;}.uagb-block-fcda15cd .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 60px;}.uagb-block-fcda15cd .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 60px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3ac63830{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-3ac63830 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3ac63830 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3ac63830 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3ac63830 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3ac63830 .uagb-container__video-wrap video{opacity: 0.3;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3ac63830 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 768px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3ac63830{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;overflow: visible;border-color: inherit;background-repeat: no-repeat;background-position: 50% 50%;background-size: cover;background-attachment: scroll;background-image: url(https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg);;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-3ac63830::before{content: "";position: absolute;pointer-events: none;top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);border-color: inherit;background: var(--ast-global-color-7);opacity: 0.7;}.uagb-block-ac68ea7b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-ac68ea7b .uagb-ifb-icon svg{fill: #333;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ac68ea7b .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ac68ea7b .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ac68ea7b .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ac68ea7b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: #ffffff;margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-title{color: #ffffff;margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-desc{color: #ffffff;margin-bottom: 0%;margin-top: 0%;margin-left: 18%;margin-right: 18%;}.uagb-block-ac68ea7b .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-ac68ea7b .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-ac68ea7b .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-ac68ea7b .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ac68ea7b .uagb-infobox__content-wrap{text-align: center;}.uagb-block-ac68ea7b.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__source-image{width: 24px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 24px;height: 24px;font-size: 24px;color: #ffffff;fill: #ffffff;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{padding: 0px;border-radius: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__label{font-size: 24px;text-decoration: !important;font-weight: 700;line-height: em;color: #ffffff;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__wrap{display: flex;flex-direction: column;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__label{text-align: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child{text-align: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 0;margin-right: 0;margin-bottom: 0px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__source-wrap{margin-right: 16px;}.uagb-block-6a0bac75.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-6a0bac75.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-a8cad5bf{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a8cad5bf > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;}.wp-block-uagb-container.uagb-block-a8cad5bf{padding-top: 80px;padding-bottom: 0px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;row-gap: 40px;background: linear-gradient(0deg, var(--ast-global-color-4) 27%, var(--ast-global-color-5) 27%);;background-clip: padding-box;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-4546b65d{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-4546b65d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;}.wp-block-uagb-container.uagb-block-4546b65d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 24px;}.uagb-block-2f5d6724.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2f5d6724.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 10%;margin-right: 10%;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2f5d6724 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2f5d6724 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2f5d6724 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2f5d6724 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2f5d6724 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2f5d6724 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2f5d6724 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2f5d6724 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-8a5fb7d2.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-a21e2965.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;border-color: #333;}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-buttons-repeater.wp-block-button__link{border-style: none;border-color: #333;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b10e0ea7{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b10e0ea7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;flex-wrap: wrap;row-gap: 25px;column-gap: 25px;}.wp-block-uagb-container.uagb-block-b10e0ea7{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 25px;column-gap: 25px;flex-direction: row;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-b10e0ea7.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-b10e0ea7.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0ee5377c{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0ee5377c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;justify-content: flex-start;}.wp-block-uagb-container.uagb-block-0ee5377c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;justify-content: flex-start;}.uagb-block-32cd06ad.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0b30df08{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0b30df08 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-0b30df08{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-56940d4a.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b5836733{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b5836733 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-b5836733{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-efbb5c4b.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1c3ff303{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1c3ff303 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-1c3ff303{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-b25d3ae6.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d1486fa4{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d1486fa4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d1486fa4{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b3bab506{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b3bab506 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-b3bab506{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-accd5b03{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-accd5b03 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-accd5b03{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-08247f23 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-29305d9e{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-29305d9e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-29305d9e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-75dbe261.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: right;align-items: center;}.wp-block-uagb-buttons .uagb-block-f5010bad.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-dba2a2c9{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-dba2a2c9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-dba2a2c9{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-658970d0{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-658970d0 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-658970d0{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3fe715a8{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3fe715a8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3fe715a8{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-87cb3bae .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-87cb3bae.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-87cb3bae .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-87cb3bae .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-87cb3bae .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d1ae2bb9{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d1ae2bb9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d1ae2bb9{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-0bfc88eb .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0bfc88eb.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0bfc88eb .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0bfc88eb .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-0bfc88eb .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae35dcf6{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae35dcf6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ae35dcf6{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-e5bc8594 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e5bc8594.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e5bc8594 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e5bc8594 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e5bc8594 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-74f2c06c{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-74f2c06c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 32px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-74f2c06c{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 32px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-74f2c06c::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-daaa5215 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-daaa5215.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-daaa5215.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 16%;margin-right: 16%;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-daaa5215 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-daaa5215 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-daaa5215 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-daaa5215 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-daaa5215 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-daaa5215.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-daaa5215.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-daaa5215.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-daaa5215 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-daaa5215 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-daaa5215 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-f8796360.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-6cc092b8.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;border-color: #333;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-buttons-repeater.wp-block-button__link{border-style: none;border-color: #333;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8c4383c7{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8c4383c7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;column-gap: 40px;}.wp-block-uagb-container.uagb-block-8c4383c7{padding-top: 80px;padding-bottom: 60px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;column-gap: 40px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c7857b8c{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c7857b8c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-c7857b8c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d4a03254{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d4a03254 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-d4a03254{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-af1c3188{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-af1c3188 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;}.wp-block-uagb-container.uagb-block-af1c3188{padding-top: 0px;padding-bottom: 24px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;row-gap: 40px;background: linear-gradient(0deg, var(--ast-global-color-5) 60%, var(--ast-global-color-4) 60%);;background-clip: padding-box;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9527e0d6{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9527e0d6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;column-gap: 40px;}.wp-block-uagb-container.uagb-block-9527e0d6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;column-gap: 40px;border-style: solid;border-color: var(--ast-global-color-6);background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-eab9a597{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-eab9a597 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;column-gap: 20px;}.wp-block-uagb-container.uagb-block-eab9a597{padding-top: 20px;padding-bottom: 20px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;column-gap: 20px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-aa320a5c{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-aa320a5c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-aa320a5c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-02f6b38a.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-02f6b38a.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 16px;height: 16px;line-height: 16px;font-size: 16px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 16px;font-size: 16px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-02f6b38a .uagb-ifb-content > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-02f6b38a .uagb-infobox-icon-right:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-02f6b38a .uagb-infobox-icon-left:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-02f6b38a .uagb-ifb-icon{width: 16px;line-height: 16px;}.uagb-block-02f6b38a .uagb-ifb-icon > span{font-size: 16px;width: 16px;line-height: 16px;}.uagb-block-02f6b38a .uagb-iconbox-icon-wrap{width: 16px;height: 16px;line-height: 16px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-02f6b38a .uagb-infobox-margin-wrapper{display: flex;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-aa90459a{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-aa90459a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-aa90459a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-6be5ca1a.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-6be5ca1a.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 16px;height: 16px;line-height: 16px;font-size: 16px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 16px;font-size: 16px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-6be5ca1a .uagb-ifb-content > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-6be5ca1a .uagb-infobox-icon-right:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-6be5ca1a .uagb-infobox-icon-left:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-6be5ca1a .uagb-ifb-icon{width: 16px;line-height: 16px;}.uagb-block-6be5ca1a .uagb-ifb-icon > span{font-size: 16px;width: 16px;line-height: 16px;}.uagb-block-6be5ca1a .uagb-iconbox-icon-wrap{width: 16px;height: 16px;line-height: 16px;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-6be5ca1a .uagb-infobox-margin-wrapper{display: flex;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-06831c8c{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-06831c8c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-06831c8c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-4f63592c.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-4f63592c.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 16px;height: 16px;line-height: 16px;font-size: 16px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 16px;font-size: 16px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-4f63592c.uagb-infobox__content-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-4f63592c .uagb-ifb-content > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-4f63592c .uagb-infobox-icon-right:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-4f63592c .uagb-infobox-icon-left:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-4f63592c.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-4f63592c .uagb-ifb-icon{width: 16px;line-height: 16px;}.uagb-block-4f63592c .uagb-ifb-icon > span{font-size: 16px;width: 16px;line-height: 16px;}.uagb-block-4f63592c .uagb-iconbox-icon-wrap{width: 16px;height: 16px;line-height: 16px;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-4f63592c .uagb-infobox-margin-wrapper{display: flex;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-22bab7c5{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-22bab7c5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-22bab7c5{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-b1ca413b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b1ca413b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 16px;height: 16px;line-height: 16px;font-size: 16px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 16px;font-size: 16px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-b1ca413b .uagb-ifb-content > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-b1ca413b .uagb-infobox-icon-right:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-b1ca413b .uagb-infobox-icon-left:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-b1ca413b .uagb-ifb-icon{width: 16px;line-height: 16px;}.uagb-block-b1ca413b .uagb-ifb-icon > span{font-size: 16px;width: 16px;line-height: 16px;}.uagb-block-b1ca413b .uagb-iconbox-icon-wrap{width: 16px;height: 16px;line-height: 16px;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-b1ca413b .uagb-infobox-margin-wrapper{display: flex;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-eae8dfad{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-eae8dfad > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: center;row-gap: 50px;}.wp-block-uagb-container.uagb-block-eae8dfad{padding-top: 60px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 50px;background-color: var(--ast-global-color-5);;}.uagb-block-bc2ef517 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-bc2ef517.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-bc2ef517.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-bc2ef517 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-bc2ef517 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-bc2ef517 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-bc2ef517 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bc2ef517 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bc2ef517.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-bc2ef517.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 10px;padding-bottom: 0px;padding-left: 10px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 10px;padding-bottom: 0px;padding-left: 10px;}.uagb-block-bc2ef517 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-bc2ef517 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-bc2ef517 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-fcbe98d1{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-fcbe98d1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;}.wp-block-uagb-container.uagb-block-fcbe98d1{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-fcbe98d1.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-fcbe98d1.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-155e7429{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-155e7429 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;}.wp-block-uagb-container.uagb-block-155e7429{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-155e7429.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-155e7429.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;} .uagb-block-681138c6.wp-block-uagb-star-rating {flex-direction: row;justify-content: center;} .uagb-block-681138c6 .uag-star-rating__title {margin-bottom: 0;} .uagb-block-681138c6 .uag-star-rating__title{margin-right: 10px;} .uagb-block-681138c6 .uag-star-rating{font-size: 22px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3c9e036a .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3c9e036a .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-3c9e036a .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-3c9e036a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3c9e036a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3c9e036a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-3c9e036a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-3c9e036a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-4718dd31.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 5px;margin-top: 12px;margin-left: 0px;margin-right: 0px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-4718dd31 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-4718dd31 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-4718dd31 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-4718dd31 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-4718dd31 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-4718dd31 .uagb-ifb-content .uagb-ifb-image-content img{width: 60px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 60px;}.uagb-block-4718dd31 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 60px;}.uagb-block-4718dd31 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 60px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1a93771e{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1a93771e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;}.wp-block-uagb-container.uagb-block-1a93771e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-1a93771e.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-1a93771e.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;} .uagb-block-cdda6aae.wp-block-uagb-star-rating {flex-direction: row;justify-content: center;} .uagb-block-cdda6aae .uag-star-rating__title {margin-bottom: 0;} .uagb-block-cdda6aae .uag-star-rating__title{margin-right: 10px;} .uagb-block-cdda6aae .uag-star-rating{font-size: 22px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ed5c6c14 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ed5c6c14 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-ed5c6c14 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-ed5c6c14 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ed5c6c14 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ed5c6c14 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ed5c6c14 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ed5c6c14 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-1c8709e0.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 5px;margin-top: 12px;margin-left: 0px;margin-right: 0px;}.uagb-block-1c8709e0.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-1c8709e0 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-1c8709e0 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-1c8709e0 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-1c8709e0 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1c8709e0 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1c8709e0 .uagb-ifb-content .uagb-ifb-image-content img{width: 60px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 60px;}.uagb-block-1c8709e0 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 60px;}.uagb-block-1c8709e0 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 60px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-86558484{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-86558484 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;}.wp-block-uagb-container.uagb-block-86558484{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-86558484.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-86558484.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;} .uagb-block-490af9a3.wp-block-uagb-star-rating {flex-direction: row;justify-content: center;} .uagb-block-490af9a3 .uag-star-rating__title {margin-bottom: 0;} .uagb-block-490af9a3 .uag-star-rating__title{margin-right: 10px;} .uagb-block-490af9a3 .uag-star-rating{font-size: 22px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-30116a41 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-30116a41 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-30116a41 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-30116a41 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-30116a41 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-30116a41 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-30116a41 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-30116a41 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-fcda15cd.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 5px;margin-top: 12px;margin-left: 0px;margin-right: 0px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-fcda15cd .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-fcda15cd .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-fcda15cd .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-fcda15cd .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-fcda15cd .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-fcda15cd .uagb-ifb-content .uagb-ifb-image-content img{width: 60px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 60px;}.uagb-block-fcda15cd .uagb-ifb-content .uagb-ifb-left-title-image img{width: 60px;}.uagb-block-fcda15cd .uagb-ifb-content .uagb-ifb-right-title-image img{width: 60px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3ac63830{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3ac63830 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 32px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3ac63830{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 32px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-3ac63830::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-ac68ea7b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 16%;margin-right: 16%;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ac68ea7b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__source-image{width: 24px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 24px;height: 24px;font-size: 24px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap {padding: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__wrap{display: flex;flex-direction: column;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 0;margin-right: 0;margin-bottom: 0px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-a8cad5bf{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a8cad5bf > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;}.wp-block-uagb-container.uagb-block-a8cad5bf{padding-top: 64px;padding-bottom: 0px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;row-gap: 40px;background: linear-gradient(0deg, var(--ast-global-color-4) 27%, var(--ast-global-color-5) 27%);;background-clip: padding-box;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-4546b65d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-4546b65d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;}.wp-block-uagb-container.uagb-block-4546b65d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 24px;flex-wrap: wrap;}.uagb-block-2f5d6724.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2f5d6724.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2f5d6724 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2f5d6724 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2f5d6724 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2f5d6724 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2f5d6724 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2f5d6724 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2f5d6724 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2f5d6724 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2f5d6724.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-8a5fb7d2.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-a21e2965.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;border-color: #333;}.wp-block-uagb-buttons .uagb-block-a21e2965 .uagb-buttons-repeater.wp-block-button__link{border-style: none;border-color: #333;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b10e0ea7{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b10e0ea7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-b10e0ea7{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0ee5377c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0ee5377c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-0ee5377c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-32cd06ad.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0b30df08{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0b30df08 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-0b30df08{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-56940d4a.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b5836733{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b5836733 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-b5836733{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-efbb5c4b.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1c3ff303{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1c3ff303 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-1c3ff303{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-b25d3ae6.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d1486fa4{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d1486fa4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d1486fa4{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b3bab506{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b3bab506 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b3bab506{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-accd5b03{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-accd5b03 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-accd5b03{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-08247f23 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-29305d9e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-29305d9e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-29305d9e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-75dbe261.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-f5010bad.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-f5010bad .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-dba2a2c9{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-dba2a2c9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-dba2a2c9{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-658970d0{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-658970d0 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-658970d0{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3fe715a8{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3fe715a8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3fe715a8{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-87cb3bae .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-87cb3bae.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-87cb3bae .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-87cb3bae .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-87cb3bae .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-87cb3bae .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-87cb3bae.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d1ae2bb9{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d1ae2bb9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d1ae2bb9{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-0bfc88eb .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0bfc88eb.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0bfc88eb .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0bfc88eb .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-0bfc88eb .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-0bfc88eb .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-0bfc88eb.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae35dcf6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae35dcf6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ae35dcf6{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-e5bc8594 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e5bc8594.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e5bc8594 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e5bc8594 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e5bc8594 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e5bc8594 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e5bc8594.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-74f2c06c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-74f2c06c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 32px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-74f2c06c{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 32px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-74f2c06c::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-daaa5215 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-daaa5215.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-daaa5215.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-daaa5215 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-daaa5215 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-daaa5215 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-daaa5215 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-daaa5215 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-daaa5215.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-daaa5215.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-daaa5215 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-daaa5215 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-daaa5215 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-daaa5215.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-f8796360.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-6cc092b8.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;border-color: #333;}.wp-block-uagb-buttons .uagb-block-6cc092b8 .uagb-buttons-repeater.wp-block-button__link{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;border-color: #333;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8c4383c7{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8c4383c7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 36px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-8c4383c7{padding-top: 64px;padding-bottom: 40px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;row-gap: 36px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c7857b8c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c7857b8c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 16px;}.wp-block-uagb-container.uagb-block-c7857b8c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 16px;flex-wrap: wrap;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d4a03254{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d4a03254 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 16px;}.wp-block-uagb-container.uagb-block-d4a03254{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 16px;flex-wrap: wrap;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-af1c3188{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-af1c3188 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 36px;}.wp-block-uagb-container.uagb-block-af1c3188{padding-top: 0px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;row-gap: 36px;background: linear-gradient(0deg, var(--ast-global-color-5) 60%, var(--ast-global-color-4) 60%);;background-clip: padding-box;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9527e0d6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9527e0d6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-9527e0d6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;border-style: solid;border-color: var(--ast-global-color-6);background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-eab9a597{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-eab9a597 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 36px;}.wp-block-uagb-container.uagb-block-eab9a597{padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;row-gap: 36px;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-aa320a5c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-aa320a5c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-aa320a5c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-02f6b38a.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-02f6b38a.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 16px;height: 16px;line-height: 16px;font-size: 16px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 16px;font-size: 16px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-02f6b38a .uagb-ifb-icon{width: 16px;line-height: 16px;}.uagb-block-02f6b38a .uagb-ifb-icon > span{font-size: 16px;width: 16px;line-height: 16px;}.uagb-block-02f6b38a .uagb-iconbox-icon-wrap{width: 16px;height: 16px;line-height: 16px;}.uagb-block-02f6b38a .uagb-infobox-margin-wrapper{display: flex;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-aa90459a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-aa90459a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-aa90459a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-6be5ca1a.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-6be5ca1a.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 16px;height: 16px;line-height: 16px;font-size: 16px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 16px;font-size: 16px;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-6be5ca1a .uagb-ifb-icon{width: 16px;line-height: 16px;}.uagb-block-6be5ca1a .uagb-ifb-icon > span{font-size: 16px;width: 16px;line-height: 16px;}.uagb-block-6be5ca1a .uagb-iconbox-icon-wrap{width: 16px;height: 16px;line-height: 16px;}.uagb-block-6be5ca1a .uagb-infobox-margin-wrapper{display: flex;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-6be5ca1a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-6be5ca1a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-06831c8c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-06831c8c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-06831c8c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-4f63592c.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-4f63592c.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 16px;height: 16px;line-height: 16px;font-size: 16px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 16px;font-size: 16px;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-4f63592c .uagb-ifb-icon{width: 16px;line-height: 16px;}.uagb-block-4f63592c .uagb-ifb-icon > span{font-size: 16px;width: 16px;line-height: 16px;}.uagb-block-4f63592c .uagb-iconbox-icon-wrap{width: 16px;height: 16px;line-height: 16px;}.uagb-block-4f63592c .uagb-infobox-margin-wrapper{display: flex;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-4f63592c .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-4f63592c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-22bab7c5{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-22bab7c5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-22bab7c5{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-b1ca413b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b1ca413b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 16px;height: 16px;line-height: 16px;font-size: 16px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 16px;font-size: 16px;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 16px;line-height: 16px;font-size: 16px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-b1ca413b .uagb-ifb-icon{width: 16px;line-height: 16px;}.uagb-block-b1ca413b .uagb-ifb-icon > span{font-size: 16px;width: 16px;line-height: 16px;}.uagb-block-b1ca413b .uagb-iconbox-icon-wrap{width: 16px;height: 16px;line-height: 16px;}.uagb-block-b1ca413b .uagb-infobox-margin-wrapper{display: flex;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-b1ca413b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-b1ca413b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-eae8dfad{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-eae8dfad > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: center;flex-wrap: wrap;row-gap: 40px;}.wp-block-uagb-container.uagb-block-eae8dfad{padding-top: 40px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;background-color: var(--ast-global-color-5);;}.uagb-block-bc2ef517 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-bc2ef517.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-bc2ef517.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-bc2ef517 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bc2ef517 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-bc2ef517 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-bc2ef517 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-bc2ef517 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-bc2ef517 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-bc2ef517 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-bc2ef517 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-bc2ef517.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-fcbe98d1{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-fcbe98d1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: wrap;align-content: center;row-gap: 30px;}.wp-block-uagb-container.uagb-block-fcbe98d1{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 30px;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: wrap;align-content: center;}.wp-block-uagb-container.uagb-block-fcbe98d1.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-fcbe98d1.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-155e7429{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-155e7429 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: wrap;row-gap: 24px;}.wp-block-uagb-container.uagb-block-155e7429{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-155e7429.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-155e7429.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;} .uagb-block-681138c6.wp-block-uagb-star-rating {flex-direction: row;justify-content: center;} .uagb-block-681138c6 .uag-star-rating__title {margin-bottom: 0;} .uagb-block-681138c6 .uag-star-rating__title{margin-right: 10px;} .uagb-block-681138c6 .uag-star-rating{font-size: 20px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-3c9e036a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3c9e036a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3c9e036a .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3c9e036a .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-3c9e036a .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-3c9e036a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-3c9e036a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-3c9e036a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-3c9e036a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-4718dd31.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 5px;margin-top: 12px;margin-left: 0px;margin-right: 0px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4718dd31.uagb-infobox__content-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4718dd31 .uagb-ifb-content > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4718dd31 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4718dd31 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4718dd31.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-4718dd31 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-4718dd31 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-4718dd31 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-4718dd31 .uagb-ifb-content .uagb-ifb-image-content img{width: 48px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 48px;}.uagb-block-4718dd31 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 48px;}.uagb-block-4718dd31 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 48px;}.uagb-block-4718dd31.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1a93771e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1a93771e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: wrap;align-content: center;row-gap: 24px;}.wp-block-uagb-container.uagb-block-1a93771e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: wrap;align-content: center;}.wp-block-uagb-container.uagb-block-1a93771e.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-1a93771e.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;} .uagb-block-cdda6aae.wp-block-uagb-star-rating {flex-direction: row;justify-content: center;} .uagb-block-cdda6aae .uag-star-rating__title {margin-bottom: 0;} .uagb-block-cdda6aae .uag-star-rating__title{margin-right: 10px;} .uagb-block-cdda6aae .uag-star-rating{font-size: 20px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-ed5c6c14 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ed5c6c14 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ed5c6c14 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ed5c6c14 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-ed5c6c14 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-ed5c6c14 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ed5c6c14 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ed5c6c14 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ed5c6c14.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-1c8709e0.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 5px;margin-top: 12px;margin-left: 0px;margin-right: 0px;}.uagb-block-1c8709e0.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c8709e0 .uagb-ifb-content > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c8709e0 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c8709e0 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-1c8709e0 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-1c8709e0 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-1c8709e0 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-1c8709e0 .uagb-ifb-content .uagb-ifb-image-content img{width: 48px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 48px;}.uagb-block-1c8709e0 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 48px;}.uagb-block-1c8709e0 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 48px;}.uagb-block-1c8709e0.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-86558484{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-86558484 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: wrap;row-gap: 24px;}.wp-block-uagb-container.uagb-block-86558484{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-86558484.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-86558484.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;} .uagb-block-490af9a3.wp-block-uagb-star-rating {flex-direction: row;justify-content: center;} .uagb-block-490af9a3 .uag-star-rating__title {margin-bottom: 0;} .uagb-block-490af9a3 .uag-star-rating__title{margin-right: 10px;} .uagb-block-490af9a3 .uag-star-rating{font-size: 20px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-30116a41 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-30116a41 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-30116a41 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-30116a41 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-30116a41 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-30116a41 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-30116a41 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-30116a41 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-30116a41.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-fcda15cd.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 5px;margin-top: 12px;margin-left: 0px;margin-right: 0px;}.uagb-block-fcda15cd.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fcda15cd .uagb-ifb-content > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fcda15cd .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fcda15cd .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-fcda15cd .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-fcda15cd .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-fcda15cd .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-fcda15cd .uagb-ifb-content .uagb-ifb-image-content img{width: 48px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 48px;}.uagb-block-fcda15cd .uagb-ifb-content .uagb-ifb-left-title-image img{width: 48px;}.uagb-block-fcda15cd .uagb-ifb-content .uagb-ifb-right-title-image img{width: 48px;}.uagb-block-fcda15cd.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3ac63830{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3ac63830 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 32px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3ac63830{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 32px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-3ac63830::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-ac68ea7b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ac68ea7b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__source-image{width: 20px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 20px;height: 20px;font-size: 20px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{padding: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__label{font-size: 20px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__wrap{display: flex;flex-direction: column;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 0;margin-right: 0;margin-bottom: 0px;}}";s:7:"content";s:19387:"
<div class="wp-block-uagb-container uagb-block-a8cad5bf alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-4546b65d">
<div class="wp-block-uagb-info-box uagb-block-2f5d6724 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h1 class="uagb-ifb-title">Welcome to our World of Creativity</h1></div><p class="uagb-ifb-desc">Step into a realm where imagination knows no bounds, and creativity is the key to unlocking endless possibilities. Our world is a canvas for your wildest ideas to come to life.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-8a5fb7d2"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-a21e2965 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>



<div class="wp-block-uagb-container uagb-block-b10e0ea7">
<div class="wp-block-uagb-container uagb-block-0ee5377c">
<div class="wp-block-uagb-image alignleft uagb-block-32cd06ad wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg" alt="" class="uag-image-80570" width="282" height="370" title="" loading="lazy"/></figure></div>
</div>



<div class="wp-block-uagb-container uagb-block-0b30df08">
<div class="wp-block-uagb-image alignleft uagb-block-56940d4a wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg" alt="" class="uag-image-80574" width="282" height="420" title="" loading="lazy"/></figure></div>
</div>



<div class="wp-block-uagb-container uagb-block-b5836733">
<div class="wp-block-uagb-image alignleft uagb-block-efbb5c4b wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-02.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-02.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-02.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-02.jpg" alt="" class="uag-image-80578" width="282" height="370" title="" loading="lazy"/></figure></div>
</div>



<div class="wp-block-uagb-container uagb-block-1c3ff303">
<div class="wp-block-uagb-image alignleft uagb-block-b25d3ae6 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/mountains-02.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/mountains-02.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/mountains-02.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/mountains-02.jpg" alt="" class="uag-image-80572" width="282" height="420" title="" loading="lazy"/></figure></div>
</div>
</div>
</div></div>



<div class="wp-block-uagb-container uagb-block-d1486fa4 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-b3bab506">
<div class="wp-block-uagb-container uagb-block-accd5b03">
<div class="wp-block-uagb-info-box uagb-block-08247f23 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Our Services</h2></div><p class="uagb-ifb-desc">Explore a wide range of services tailored to your needs.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-29305d9e">
<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-75dbe261"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-f5010bad wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Learn More</div></a></div></div>
</div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-dba2a2c9">
<div class="wp-block-uagb-container uagb-block-658970d0">
<div class="wp-block-uagb-container uagb-block-3fe715a8">
<div class="wp-block-uagb-info-box uagb-block-87cb3bae uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">01</h6><h5 class="uagb-ifb-title">Service 1</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 1.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-d1ae2bb9">
<div class="wp-block-uagb-info-box uagb-block-0bfc88eb uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">02</h6><h5 class="uagb-ifb-title">Service 2</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 2.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-ae35dcf6">
<div class="wp-block-uagb-info-box uagb-block-e5bc8594 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">03</h6><h5 class="uagb-ifb-title">Service 3</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 3.</p></div></div>
</div>
</div>
</div>
</div></div>



<div class="wp-block-uagb-container uagb-block-74f2c06c alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-daaa5215 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">Empower Your Journey</h6><h2 class="uagb-ifb-title">Take the Action Now</h2></div><p class="uagb-ifb-desc">Join us in shaping a brighter future. Let's embark on this exciting adventure together.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-f8796360"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-6cc092b8 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div></div>



<div class="wp-block-uagb-container uagb-block-8c4383c7 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-c7857b8c">
<div class="wp-block-uagb-image alignleft uagb-block-955803d2 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg 780w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg" alt="" class="uag-image-80574" width="600" height="450" title="" loading="lazy"/></figure></div>
</div>



<div class="wp-block-uagb-container uagb-block-d4a03254">
<div class="wp-block-uagb-info-box uagb-block-7edef7ac uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">About Us</h3></div><p class="uagb-ifb-desc">We are a passionate team dedicated to delivering exceptional results. With a focus on innovation and excellence, we are committed to helping you achieve your goals and dreams.</p><div class="uagb-ifb-button-wrapper wp-block-button"><a href="#" target="_self" onclick="return false;" class="uagb-infobox-cta-link" rel="noopener noreferrer" alt=""><span class="uagb-inline-editing">Read More</span><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></a></div></div></div>
</div>
</div></div>



<div class="wp-block-uagb-container uagb-block-af1c3188 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-9527e0d6">
<div class="wp-block-uagb-container uagb-block-eab9a597">
<div class="wp-block-uagb-container uagb-block-aa320a5c">
<div class="wp-block-uagb-info-box uagb-block-02f6b38a uagb-infobox__content-wrap  uagb-infobox-icon-left uagb-infobox-left uagb-infobox-image-valign-top"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">92%</h3></div><p class="uagb-ifb-desc">Stats title here</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-aa90459a">
<div class="wp-block-uagb-info-box uagb-block-6be5ca1a uagb-infobox__content-wrap  uagb-infobox-icon-left uagb-infobox-left uagb-infobox-image-valign-top"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">2,480</h3></div><p class="uagb-ifb-desc">Stats title here</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-06831c8c">
<div class="wp-block-uagb-info-box uagb-block-4f63592c uagb-infobox__content-wrap  uagb-infobox-icon-left uagb-infobox-left uagb-infobox-image-valign-top"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">12+</h3></div><p class="uagb-ifb-desc">Stats title here</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-22bab7c5">
<div class="wp-block-uagb-info-box uagb-block-b1ca413b uagb-infobox__content-wrap  uagb-infobox-icon-left uagb-infobox-left uagb-infobox-image-valign-top"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">640K</h3></div><p class="uagb-ifb-desc">Stats title here</p></div></div>
</div>
</div>
</div>
</div></div>



<div class="wp-block-uagb-container uagb-block-eae8dfad alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-bc2ef517 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">Words from Our Clients</h6><h2 class="uagb-ifb-title">Testimonials</h2></div><p class="uagb-ifb-desc">Hear what our satisfied clients have to say about their experiences with us.</p></div></div>



<div class="wp-block-uagb-container uagb-block-fcbe98d1">
<div class="wp-block-uagb-container uagb-block-155e7429">
<div class="wp-block-uagb-star-rating uagb-block-681138c6"><div class="uag-star-rating" title="5/5"><span class="uag-star">★</span><span class="uag-star">★</span><span class="uag-star">★</span><span class="uag-star">★</span><span class="uag-star">★</span></div></div>



<div class="wp-block-uagb-info-box uagb-block-3c9e036a uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Exceptional service! This company goes above and beyond to meet their customers' needs. I couldn't be happier with the results.</p></div></div>



<div class="wp-block-uagb-info-box uagb-block-4718dd31 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-image-content"><img src="https://websitedemos.net/wp-content/uploads/2023/10/testimonial-skip-06.jpg" alt="" width="60" height="60" loading="lazy"/></div><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title">Your Client 1</h6></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-1a93771e">
<div class="wp-block-uagb-star-rating uagb-block-cdda6aae"><div class="uag-star-rating" title="5/5"><span class="uag-star">★</span><span class="uag-star">★</span><span class="uag-star">★</span><span class="uag-star">★</span><span class="uag-star">★</span></div></div>



<div class="wp-block-uagb-info-box uagb-block-ed5c6c14 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Outstanding quality and professionalism. I've been a loyal customer for years and have never been disappointed.</p></div></div>



<div class="wp-block-uagb-info-box uagb-block-1c8709e0 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-image-content"><img src="https://websitedemos.net/wp-content/uploads/2023/10/testimonial-skip-08.jpg" alt="" width="60" height="60" loading="lazy"/></div><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title">Your Client 2</h6></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-86558484">
<div class="wp-block-uagb-star-rating uagb-block-490af9a3"><div class="uag-star-rating" title="5/5"><span class="uag-star">★</span><span class="uag-star">★</span><span class="uag-star">★</span><span class="uag-star">★</span><span class="uag-star">★</span></div></div>



<div class="wp-block-uagb-info-box uagb-block-30116a41 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Reliable and trustworthy. I highly recommend this business to anyone looking for top-notch products/services.</p></div></div>



<div class="wp-block-uagb-info-box uagb-block-fcda15cd uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-image-content"><img src="https://websitedemos.net/wp-content/uploads/2023/10/testimonial-skip-07.jpg" alt="" width="60" height="60" loading="lazy"/></div><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title">Your Client 3</h6></div></div></div>
</div>
</div>
</div></div>



<div class="wp-block-uagb-container uagb-block-3ac63830 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-ac68ea7b uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">Stay Connected with Us</h6><h2 class="uagb-ifb-title">Let's Create Together</h2></div><p class="uagb-ifb-desc">Connect with us to explore how we can make your vision a reality. Join us in shaping the future.</p></div></div>



<div class="wp-block-uagb-icon-list uagb-block-18525ae3"><div class="uagb-icon-list__wrap">
<div class="wp-block-uagb-icon-list-child uagb-block-6a0bac75"><a target="_self" aria-label="202-555-0188" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 512 512"><path d="M511.2 387l-23.25 100.8c-3.266 14.25-15.79 24.22-30.46 24.22C205.2 512 0 306.8 0 54.5c0-14.66 9.969-27.2 24.22-30.45l100.8-23.25C139.7-2.602 154.7 5.018 160.8 18.92l46.52 108.5c5.438 12.78 1.77 27.67-8.98 36.45L144.5 207.1c33.98 69.22 90.26 125.5 159.5 159.5l44.08-53.8c8.688-10.78 23.69-14.51 36.47-8.975l108.5 46.51C506.1 357.2 514.6 372.4 511.2 387z"></path></svg></span><span class="uagb-icon-list__label">202-555-0188</span></div>
</div></div>
</div></div>
";}s:8:"id-82432";a:10:{s:5:"title";s:15:"Contact Page 05";s:3:"url";s:54:"https://websitedemos.net/astra-blocks/contact-page-05/";s:3:"tag";a:0:{}s:8:"category";i:3394;s:16:"primary-category";s:0:"";s:4:"type";s:4:"page";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:93601:".wp-block-uagb-container.uagb-is-root-container .uagb-block-5657136f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-5657136f .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-5657136f .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-5657136f .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-5657136f .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-5657136f .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5657136f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-5657136f{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-5);;}.uagb-block-48b77c69 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-48b77c69 .uagb-ifb-icon svg{fill: #333;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-48b77c69 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-48b77c69 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-48b77c69 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-48b77c69 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-48b77c69 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-48b77c69 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-48b77c69 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-48b77c69 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-48b77c69.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-48b77c69.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-06414442{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-06414442 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-06414442 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-06414442 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-06414442 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-06414442 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-block-06414442{min-height: 350px;box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;background-repeat: no-repeat;background-position: 50% 50%;background-size: 100%;background-attachment: fixed;background-image: url(https://websitedemos.net/wp-content/uploads/2023/10/trees-rivers-01.jpg);;background-clip: padding-box;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d09bcccb{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-d09bcccb .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d09bcccb .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d09bcccb .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d09bcccb .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d09bcccb .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d09bcccb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-d09bcccb{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f3d35d25{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-f3d35d25 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f3d35d25 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f3d35d25 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f3d35d25 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f3d35d25 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f3d35d25 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 64px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-f3d35d25{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 64px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-712f620b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-712f620b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-712f620b .uagb-ifb-icon svg{fill: #333;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-712f620b .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-712f620b .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-712f620b .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-712f620b .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-712f620b .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-712f620b .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-712f620b.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-712f620b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-712f620b.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-712f620b.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-712f620b .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-712f620b .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-712f620b .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-712f620b .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-712f620b .uagb-infobox__content-wrap{text-align: left;}.uagb-block-712f620b.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-712f620b.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-712f620b.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-712f620b .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-712f620b .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-712f620b .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-280efcfc{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-280efcfc .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-280efcfc .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-280efcfc .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-280efcfc .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-280efcfc .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-280efcfc > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-280efcfc{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-642ee402 .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-642ee402 .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;color: var(--ast-global-color-2);}.uagb-block-642ee402 .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-642ee402 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-642ee402 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 20px;height: 20px;line-height: 20px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-642ee402 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-642ee402 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-642ee402 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-642ee402 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-642ee402.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-642ee402 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-642ee402.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-642ee402.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-642ee402 .uagb-ifb-separator{width: 100%;border-top-width: 1px;border-top-color: var(--ast-global-color-6);border-top-style: solid;margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-642ee402 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 100%;border-top-width: 1px;border-top-color: var(--ast-global-color-6);border-top-style: solid;}.uagb-block-642ee402 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-642ee402 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-642ee402 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-642ee402 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-642ee402 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-dd299685 .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-dd299685 .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;color: var(--ast-global-color-2);}.uagb-block-dd299685 .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-dd299685 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-dd299685 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 20px;height: 20px;line-height: 20px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-dd299685 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-dd299685 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-dd299685 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-dd299685 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-dd299685.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-dd299685 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-dd299685.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-dd299685.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-dd299685 .uagb-ifb-separator{width: 100%;border-top-width: 1px;border-top-color: var(--ast-global-color-6);border-top-style: solid;margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-dd299685 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 100%;border-top-width: 1px;border-top-color: var(--ast-global-color-6);border-top-style: solid;}.uagb-block-dd299685 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-dd299685 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-dd299685 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-dd299685 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-dd299685 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-1622c95c .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-1622c95c .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;color: var(--ast-global-color-2);}.uagb-block-1622c95c .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-1622c95c .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-1622c95c .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 20px;height: 20px;line-height: 20px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1622c95c .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-1622c95c .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-1622c95c .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1622c95c .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-1622c95c.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-1622c95c .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-1622c95c.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1622c95c.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1622c95c .uagb-ifb-separator{width: 100%;border-top-width: 1px;border-top-color: var(--ast-global-color-6);border-top-style: solid;margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1622c95c .uagb-infobox__content-wrap .uagb-ifb-separator{width: 100%;border-top-width: 1px;border-top-color: var(--ast-global-color-6);border-top-style: solid;}.uagb-block-1622c95c .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-1622c95c .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-1622c95c .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-1622c95c .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-1622c95c .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-c0e97020.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-c0e97020.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.uagb-block-c0e97020 .uagb-buttons-repeater:not(.wp-block-button__link){padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;}.uagb-block-c0e97020 .uagb-buttons-repeater.wp-block-button__link{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;}.uagb-block-c0e97020 .uagb-button__wrapper{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-48722afa .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-48722afa .wp-block-button__link:hover{background: transparent;}.wp-block-uagb-buttons .uagb-block-48722afa .wp-block-button__link:focus{background: transparent;}.wp-block-uagb-buttons .uagb-block-48722afa .uagb-button__wrapper .uagb-buttons-repeater{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-48722afa .wp-block-button__link.has-text-color:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-48722afa .wp-block-button__link.has-text-color:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-48722afa .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-48722afa .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-48722afa .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-48722afa .uagb-buttons-repeater:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-48722afa .uagb-buttons-repeater:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-48722afa .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-48722afa .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-48722afa .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-48722afa .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-48722afa .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-48722afa .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-6e0341ce{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-6e0341ce .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-6e0341ce .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-6e0341ce .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-6e0341ce .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-6e0341ce .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-6e0341ce > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-6e0341ce{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;} .uagb-block-f60ef0a3 .uagb-google-map__iframe{height: 400px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9a90daa4{max-width: 65%;width: 100%;}.wp-block-uagb-container.uagb-block-9a90daa4 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9a90daa4 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9a90daa4 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9a90daa4 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9a90daa4 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9a90daa4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9a90daa4{box-shadow: 0px 4px 8px -2px rgba(0,0,0,0.1) ;padding-top: 48px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-4);;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-d6b570b9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-d6b570b9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-d6b570b9 .uagb-ifb-icon svg{fill: #333;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-d6b570b9 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-d6b570b9 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-d6b570b9 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-d6b570b9 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-d6b570b9 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-d6b570b9 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-d6b570b9 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-d6b570b9.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d6b570b9.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d6b570b9 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-d6b570b9 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-d6b570b9 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-d6b570b9 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-d6b570b9 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-d6b570b9.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-d6b570b9.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-d6b570b9 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-d6b570b9 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-d6b570b9 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-d6334bf6.uagb-forms__outer-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-d6334bf6 .uagb-forms-main-form textarea{text-align: left;}.uagb-block-d6334bf6 .uagb-forms-input{text-align: left;}.uagb-block-d6334bf6 .uagb-forms-input-label{display: block;text-align: left;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-field-set{margin-bottom: 20px;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-input-label{font-size: 15px;color: var(--ast-global-color-2);margin-bottom: 10px;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-input:focus{outline:  none !important;border-color: var(--ast-global-color-6);background-color: var(--ast-global-color-5) !important;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-input:focus::placeholder{color: var(--ast-global-color-2) !important;}.uagb-block-d6334bf6 .uagb-forms-field-set:hover .uagb-forms-input-label{color: var(--ast-global-color-2);}.uagb-block-d6334bf6 .uagb-forms-field-set:hover .uagb-forms-input{background-color: var(--ast-global-color-5);}.uagb-block-d6334bf6 .uagb-forms-field-set:hover .uagb-forms-input::placeholder{color: var(--ast-global-color-2);}.uagb-block-d6334bf6 .uagb-slider.round{border-radius: 20px !important;}.uagb-block-d6334bf6 .uagb-form-phone-country{background: url(data:image/svg+xml;base64,PHN2ZyB2aWV3Qm94PSIwIDAgNTEyIDUxMiIgd2lkdGg9JzE4cHgnIGhlaWdodD0nMThweCcgeG1sOnNwYWNlPSJwcmVzZXJ2ZSIgeG1sbnM9Imh0dHA6Ly93d3cudzMub3JnLzIwMDAvc3ZnIiBlbmFibGUtYmFja2dyb3VuZD0ibmV3IDAgMCA1MTIgNTEyIj48cGF0aCBkPSJtMzk2LjYgMTYwIDE5LjQgMjAuN0wyNTYgMzUyIDk2IDE4MC43bDE5LjMtMjAuN0wyNTYgMzEwLjV6IiBmaWxsPSIjMWQyMzI3IiBjbGFzcz0iZmlsbC0wMDAwMDAiPjwvcGF0aD48L3N2Zz4=) no-repeat;-moz-appearance: none !important;-webkit-appearance:  none !important;background-position:  top 50% right 12px;appearance: none !important;color: var(--ast-global-color-2);}.uagb-block-d6334bf6 .uagb-forms-field-set:hover .uagb-form-phone-country{color: var(--ast-global-color-2);}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-main-submit-button-wrap{text-align: left;}.uagb-block-d6334bf6 .uagb-forms-checkbox-wrap input[type=checkbox] + label:before{background-color: #ffffff;width: 15px;height: 15px;}.uagb-block-d6334bf6 .uagb-forms-radio-wrap input[type=radio] + label:before{background-color: #ffffff;width: 15px;height: 15px;}.uagb-block-d6334bf6 .uagb-slider{background-color: #ffffff;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-switch{height: calc(1px + 1px + 26px);width: calc(1px + 1px + 56px);}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-slider:before{height: 20px;width: 20px;top: 3px;bottom: 3px;left: 3px;background-color: #1e1e1e;border-radius: 3px 3px 3px 3px;}.uagb-block-d6334bf6 .uagb-switch input:checked + .uagb-slider{background-color: #017cba;}.uagb-block-d6334bf6 .uagb-switch input:checked + .uagb-slider:before{transform: translateX(30px);background-color: #ffffff;}.uagb-block-d6334bf6 .uagb-switch input:focus + .uagb-slider{box-shadow: 0 0 1px#017cba;}.uagb-block-d6334bf6 .uagb-forms-accept-wrap input[type=checkbox] + label:before{background-color: #ffffff;width: 15px;height: 15px;}.uagb-block-d6334bf6 .uagb-forms-main-form  .uagb-forms-checkbox-wrap input[type=checkbox] + label:before{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 3px;border-top-right-radius: 3px;border-bottom-left-radius: 3px;border-bottom-right-radius: 3px;border-color: #BDBDBD;border-style: solid;}.uagb-block-d6334bf6 .uagb-forms-main-form  .uagb-forms-radio-wrap input[type=radio] + label:before{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 3px;border-top-right-radius: 3px;border-bottom-left-radius: 3px;border-bottom-right-radius: 3px;border-color: #BDBDBD;border-style: solid;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-slider{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 3px;border-top-right-radius: 3px;border-bottom-left-radius: 3px;border-bottom-right-radius: 3px;border-color: #BDBDBD;border-style: solid;}.uagb-block-d6334bf6 .uagb-forms-main-form  .uagb-forms-accept-wrap input[type=checkbox] + label:before{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 3px;border-top-right-radius: 3px;border-bottom-left-radius: 3px;border-bottom-right-radius: 3px;border-color: #BDBDBD;border-style: solid;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-input{background-color: var(--ast-global-color-5);border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-6);border-style: solid;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-input.uagb-form-phone-country{padding-top: 11px;padding-bottom: 11px;padding-left: 12px;padding-right: 12px;}.uagb-block-d6334bf6 .uagb-forms-input:hover{border-color: var(--ast-global-color-6);}.uagb-block-d6334bf6 .uagb-forms-input::placeholder{color: var(--ast-global-color-2);}.uagb-block-d6334bf6 .uagb-forms-main-form  .uagb-forms-input{padding-top: 12px;padding-bottom: 12px;padding-left: 12px;padding-right: 12px;}.uagb-block-d6334bf6 .uagb-forms-checkbox-wrap input[type=checkbox]:checked + label:before{color: #ffffff;background-color: #017cba;font-size: calc(15px / 1.2);}.uagb-block-d6334bf6 .uagb-forms-radio-wrap input[type=radio]:checked + label:before{background-color: #ffffff;box-shadow: inset 0 0 0 4px #017cba;font-size: calc(15px / 1.2);}.uagb-block-d6334bf6 .uagb-forms-accept-wrap input[type=checkbox]:checked + label:before{color: #ffffff;background-color: #017cba;font-size: calc(15px / 1.2);}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-main-submit-button-wrap.wp-block-button:not(.is-style-outline) .uagb-forms-main-submit-button.wp-block-button__link {font-size: 15px;color: #ffffff;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-main-submit-button {font-size: 15px;color: #ffffff;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-main-submit-button-wrap.wp-block-button:not(.is-style-outline) .uagb-forms-main-submit-button.wp-block-button__link:hover {color: #ffffff;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-main-submit-button:hover{color: #ffffff;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-main-submit-button-wrap.wp-block-button:not(.is-style-outline) .uagb-forms-main-submit-button.wp-block-button__link:focus {color: #ffffff;background-color: var(--ast-global-color-1);}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-main-submit-button:focus{color: #ffffff;background-color: var(--ast-global-color-1);}.uagb-block-d6334bf6 .uagb-forms__full-btn .uagb-forms-main-submit-button-wrap .uagb-forms-main-submit-button{width: 100%;padding: 10px 15px;}.uagb-block-d6334bf6.uagb-forms__small-btn .uagb-forms-main-submit-button-wrap .uagb-forms-main-submit-button{padding: 5px 10px;}.uagb-block-d6334bf6.uagb-forms__medium-btn .uagb-forms-main-submit-button-wrap .uagb-forms-main-submit-button{padding: 12px 24px;}.uagb-block-d6334bf6.uagb-forms__large-btn .uagb-forms-main-submit-button-wrap .uagb-forms-main-submit-button{padding: 20px 30px;}.uagb-block-d6334bf6.uagb-forms__extralarge-btn .uagb-forms-main-submit-button-wrap .uagb-forms-main-submit-button{padding: 30px 65px;}.uagb-block-d6334bf6 .uagb-forms-main-form .wp-block-button:not(.is-style-outline) .uagb-forms-main-submit-button.wp-block-button__link{background: var(--ast-global-color-0);}.uagb-block-d6334bf6  .uagb-forms-main-form .wp-block-button:not(.is-style-outline) .uagb-forms-main-submit-button.wp-block-button__link:hover{background: var(--ast-global-color-1);}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-main-submit-button{font-size: 15px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3ac63830{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-3ac63830 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3ac63830 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3ac63830 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3ac63830 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3ac63830 .uagb-container__video-wrap video{opacity: 0.3;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3ac63830 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 768px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3ac63830{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;overflow: visible;border-color: inherit;background-repeat: no-repeat;background-position: 50% 50%;background-size: cover;background-attachment: scroll;background-image: url(https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg);;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-3ac63830::before{content: "";position: absolute;pointer-events: none;top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);border-color: inherit;background: var(--ast-global-color-7);opacity: 0.7;}.uagb-block-ac68ea7b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-ac68ea7b .uagb-ifb-icon svg{fill: #333;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ac68ea7b .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ac68ea7b .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ac68ea7b .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ac68ea7b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: #ffffff;margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-title{color: #ffffff;margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-desc{color: #ffffff;margin-bottom: 0%;margin-top: 0%;margin-left: 18%;margin-right: 18%;}.uagb-block-ac68ea7b .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-ac68ea7b .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-ac68ea7b .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-ac68ea7b .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ac68ea7b .uagb-infobox__content-wrap{text-align: center;}.uagb-block-ac68ea7b.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__source-image{width: 24px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 24px;height: 24px;font-size: 24px;color: #ffffff;fill: #ffffff;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{padding: 0px;border-radius: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__label{font-size: 24px;text-decoration: !important;font-weight: 700;line-height: em;color: #ffffff;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__wrap{display: flex;flex-direction: column;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__label{text-align: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child{text-align: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 0;margin-right: 0;margin-bottom: 0px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__source-wrap{margin-right: 16px;}.uagb-block-6a0bac75.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-6a0bac75.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-5657136f{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5657136f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-5657136f{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-48b77c69 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-06414442{width: 100%;}.wp-block-uagb-container.uagb-block-06414442{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d09bcccb{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d09bcccb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: center;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-d09bcccb{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f3d35d25{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f3d35d25 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: center;row-gap: 30px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-f3d35d25{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 30px;column-gap: 0px;align-items: center;}.uagb-block-712f620b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-712f620b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-712f620b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-712f620b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-712f620b .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-712f620b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-712f620b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-712f620b.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-712f620b.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-712f620b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-712f620b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-712f620b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-280efcfc{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-280efcfc > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 10px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-280efcfc{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 10px;column-gap: 0px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 20px;font-size: 20px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-642ee402 .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-642ee402 .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;}.uagb-block-642ee402 .uagb-iconbox-icon-wrap{width: 20px;height: 20px;line-height: 20px;}.uagb-block-642ee402 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 20px;line-height: 20px;font-size: 20px;}.uagb-block-642ee402 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 20px;line-height: 20px;font-size: 20px;}.uagb-block-642ee402 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-642ee402 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-642ee402 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 20px;font-size: 20px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-dd299685 .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-dd299685 .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;}.uagb-block-dd299685 .uagb-iconbox-icon-wrap{width: 20px;height: 20px;line-height: 20px;}.uagb-block-dd299685 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 20px;line-height: 20px;font-size: 20px;}.uagb-block-dd299685 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 20px;line-height: 20px;font-size: 20px;}.uagb-block-dd299685 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-dd299685 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-dd299685 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 20px;font-size: 20px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-1622c95c .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-1622c95c .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;}.uagb-block-1622c95c .uagb-iconbox-icon-wrap{width: 20px;height: 20px;line-height: 20px;}.uagb-block-1622c95c .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 20px;line-height: 20px;font-size: 20px;}.uagb-block-1622c95c .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 20px;line-height: 20px;font-size: 20px;}.uagb-block-1622c95c .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-1622c95c .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-1622c95c .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-c0e97020.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-48722afa .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-6e0341ce{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-6e0341ce > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-6e0341ce{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;} .uagb-block-f60ef0a3 .uagb-google-map__iframe{height: 400px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9a90daa4{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9a90daa4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9a90daa4{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-d6b570b9.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d6b570b9.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-d6b570b9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-d6b570b9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-d6b570b9 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-d6b570b9 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d6b570b9 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-d6b570b9 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-d6b570b9 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-d6b570b9 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-d6334bf6.uagb-forms__outer-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-input-label{font-size: 15px;}.uagb-block-d6334bf6 .uagb-slider.round{border-radius: 20px !important;}.uagb-block-d6334bf6 .uagb-form-phone-country{background-position: top 50% right 12px;padding-right: 30px !important;}.uagb-block-d6334bf6 .uagb-forms-main-form  .uagb-forms-checkbox-wrap input[type=checkbox] + label:before{border-style: solid;border-color: #BDBDBD;}.uagb-block-d6334bf6 .uagb-forms-main-form  .uagb-forms-radio-wrap input[type=radio] + label:before{border-style: solid;border-color: #BDBDBD;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-slider{border-style: solid;border-color: #BDBDBD;}.uagb-block-d6334bf6 .uagb-forms-main-form  .uagb-forms-accept-wrap input[type=checkbox] + label:before{border-style: solid;border-color: #BDBDBD;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-input{border-style: solid;border-color: var(--ast-global-color-6);}.uagb-block-d6334bf6 .uagb-switch input:checked + .uagb-slider:before{transform: translateX(30px);}.uagb-block-d6334bf6 .uagb-forms-checkbox-wrap input[type=checkbox]:checked + label:before{font-size: calc(15px / 1.2);}.uagb-block-d6334bf6 .uagb-forms-radio-wrap input[type=radio]:checked + label:before{font-size: calc(15px / 1.2);}.uagb-block-d6334bf6 .uagb-forms-accept-wrap input[type=checkbox]:checked + label:before{font-size: calc(15px / 1.2);}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-switch{height: calc(1px + 1px + 26px);width: calc(1px + 1px + 56px);}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-slider:before{height: calc(20px + 0px);width: calc(20px + 0px);top: 3px;bottom: 3px;left: 3px;border-radius: 3px 3px 3px 3px;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-main-submit-button{font-size: 15px;border-style: none;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-main-submit-button-wrap.wp-block-button:not(.is-style-outline) .uagb-forms-main-submit-button.wp-block-button__link {border-style: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3ac63830{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3ac63830 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 32px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3ac63830{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 32px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-3ac63830::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-ac68ea7b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 16%;margin-right: 16%;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ac68ea7b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__source-image{width: 24px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 24px;height: 24px;font-size: 24px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap {padding: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__wrap{display: flex;flex-direction: column;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 0;margin-right: 0;margin-bottom: 0px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-5657136f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5657136f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-5657136f{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 28px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-48b77c69 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-06414442{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-06414442{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;background-clip: padding-box;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d09bcccb{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d09bcccb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: center;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d09bcccb{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f3d35d25{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f3d35d25 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: center;flex-wrap: wrap;row-gap: 36px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-f3d35d25{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 36px;column-gap: 0px;align-items: center;flex-wrap: wrap;}.uagb-block-712f620b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-712f620b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-712f620b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-712f620b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-712f620b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-712f620b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-712f620b .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-712f620b.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-712f620b.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-712f620b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-712f620b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-712f620b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-712f620b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-280efcfc{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-280efcfc > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-280efcfc{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 20px;font-size: 20px;}.uagb-block-642ee402 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 20px;line-height: 20px;font-size: 20px;}.uagb-block-642ee402 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 20px;line-height: 20px;font-size: 20px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-642ee402 .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-642ee402 .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;}.uagb-block-642ee402 .uagb-iconbox-icon-wrap{width: 20px;height: 20px;line-height: 20px;}.uagb-block-642ee402 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-642ee402 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-642ee402 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-642ee402.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 20px;font-size: 20px;}.uagb-block-dd299685 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 20px;line-height: 20px;font-size: 20px;}.uagb-block-dd299685 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 20px;line-height: 20px;font-size: 20px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-dd299685 .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-dd299685 .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;}.uagb-block-dd299685 .uagb-iconbox-icon-wrap{width: 20px;height: 20px;line-height: 20px;}.uagb-block-dd299685 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-dd299685 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-dd299685 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-dd299685.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 20px;font-size: 20px;}.uagb-block-1622c95c .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 20px;line-height: 20px;font-size: 20px;}.uagb-block-1622c95c .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 20px;line-height: 20px;font-size: 20px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-1622c95c .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-1622c95c .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;}.uagb-block-1622c95c .uagb-iconbox-icon-wrap{width: 20px;height: 20px;line-height: 20px;}.uagb-block-1622c95c .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-1622c95c .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-1622c95c .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-1622c95c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-c0e97020.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-48722afa .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-6e0341ce{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-6e0341ce > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-6e0341ce{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;} .uagb-block-f60ef0a3 .uagb-google-map__iframe{height: 350px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9a90daa4{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9a90daa4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9a90daa4{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-4);;flex-wrap: wrap;}.uagb-block-d6b570b9.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d6b570b9.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-d6b570b9 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d6b570b9 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-d6b570b9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-d6b570b9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-d6b570b9 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-d6b570b9 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-d6b570b9 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-d6b570b9 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-d6b570b9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-d6334bf6.uagb-forms__outer-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-input-label{font-size: 15px;}.uagb-block-d6334bf6 .uagb-slider.round{border-radius: 20px !important;}.uagb-block-d6334bf6 .uagb-form-phone-country{background-position: top 50% right 6px;padding-right: 30px !important;}.uagb-block-d6334bf6 .uagb-forms-main-form  .uagb-forms-checkbox-wrap input[type=checkbox] + label:before{border-style: solid;border-color: #BDBDBD;}.uagb-block-d6334bf6 .uagb-forms-main-form  .uagb-forms-radio-wrap input[type=radio] + label:before{border-style: solid;border-color: #BDBDBD;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-slider{border-style: solid;border-color: #BDBDBD;}.uagb-block-d6334bf6 .uagb-forms-main-form  .uagb-forms-accept-wrap input[type=checkbox] + label:before{border-style: solid;border-color: #BDBDBD;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-input{border-style: solid;border-color: var(--ast-global-color-6);}.uagb-block-d6334bf6 .uagb-switch input:checked + .uagb-slider:before{transform: translateX(30px);}.uagb-block-d6334bf6 .uagb-forms-checkbox-wrap input[type=checkbox]:checked + label:before{font-size: calc(15px / 1.2);}.uagb-block-d6334bf6 .uagb-forms-radio-wrap input[type=radio]:checked + label:before{font-size: calc(15px / 1.2);}.uagb-block-d6334bf6 .uagb-forms-accept-wrap input[type=checkbox]:checked + label:before{font-size: calc(15px / 1.2);}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-switch{height: calc(1px + 1px + 26px);width: calc(1px + 1px + 56px);}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-slider:before{height: calc(20px + 0px);width: calc(20px + 0px);top: 3px;bottom: 3px;left: 3px;border-radius: 3px 3px 3px 3px;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-main-submit-button{font-size: 15px;border-style: none;}.uagb-block-d6334bf6 .uagb-forms-main-form .uagb-forms-main-submit-button-wrap.wp-block-button:not(.is-style-outline) .uagb-forms-main-submit-button.wp-block-button__link {border-style: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3ac63830{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3ac63830 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 32px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3ac63830{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 32px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-3ac63830::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-ac68ea7b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ac68ea7b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap:not(.wp-block-uagb-info-box--has-margin){padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap.wp-block-uagb-info-box--has-margin .uagb-infobox-margin-wrapper{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__source-image{width: 20px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 20px;height: 20px;font-size: 20px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{padding: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__label{font-size: 20px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__wrap{display: flex;flex-direction: column;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 0;margin-right: 0;margin-bottom: 0px;}}";s:7:"content";s:9273:"
<div class="wp-block-uagb-container uagb-block-5657136f alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-48b77c69 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h1 class="uagb-ifb-title">Get in Touch</h1></div><p class="uagb-ifb-desc">Reach out to us. We're here to assist you and answer your queries.</p></div></div>
</div></div>



<div class="wp-block-uagb-container uagb-block-06414442 alignfull uagb-is-root-container"></div>



<div class="wp-block-uagb-container uagb-block-d09bcccb alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-f3d35d25">
<div class="wp-block-uagb-info-box uagb-block-712f620b uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">Contact Us</h3></div><p class="uagb-ifb-desc">Find our contact details and get in touch with our team for any assistance or inquiries.</p></div></div>



<div class="wp-block-uagb-container uagb-block-280efcfc">
<div class="wp-block-uagb-info-box uagb-block-642ee402 uagb-infobox__content-wrap  uagb-infobox-icon-left-title uagb-infobox-left uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-left-title-image"><div class="uagb-ifb-icon-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 384 512"><path d="M168.3 499.2C116.1 435 0 279.4 0 192C0 85.96 85.96 0 192 0C298 0 384 85.96 384 192C384 279.4 267 435 215.7 499.2C203.4 514.5 180.6 514.5 168.3 499.2H168.3zM192 256C227.3 256 256 227.3 256 192C256 156.7 227.3 128 192 128C156.7 128 128 156.7 128 192C128 227.3 156.7 256 192 256z"></path></svg></div><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title">2360 Hood Avenue, San Diego, CA, 92123</h6></div></div></div></div>
